Title: keer 10 en gedeeld door 10
Course: Rekenregels 8

Q: 9 : 10 =
A: 0.9

Q: 154 : 100 =
A: 1.54

Q: 53 : 1000 =
A: 0.053

Q: 6 : 10 =
A: 0.6

Q: 192 : 100 =
A: 1.92

Q: 235 : 1000 =
A: 0.235

Q: 151 : 100 =
A: 1.51

Q: 226 : 1000 =
A: 0.226

Q: 8 : 10 =
A: 0.8

Q: 99 : 100 =
A: 0.99

Q: 110 : 1000 =
A: 0.11

Q: 2 : 10 =
A: 0.2

Q: 90 : 100 =
A: 0.9

Q: 215 : 1000 =
A: 0.215

Q: 4 : 10 =
A: 0.4

Q: 144 : 100 =
A: 1.44

Q: 51 : 1000 =
A: 0.051

Q: 10 : 10 =
A: 1

Q: 143 : 100 =
A: 1.43

Q: 219 : 1000 =
A: 0.219

Q: 5 : 10 =
A: 0.5

Q: 238 : 100 =
A: 2.38

Q: 81 : 1000 =
A: 0.081

Q: 164 : 100 =
A: 1.64

Q: 210 : 1000 =
A: 0.21

Q: 174 : 100 =
A: 1.74

Q: 139 : 1000 =
A: 0.139

Q: 201 : 100 =
A: 2.01

Q: 182 : 1000 =
A: 0.182

Q: 7 : 10 =
A: 0.7

Q: 211 : 100 =
A: 2.11

Q: 57 : 1000 =
A: 0.057

Q: 60 : 100 =
A: 0.6

Q: 70 : 1000 =
A: 0.07

Q: 148 : 100 =
A: 1.48

Q: 84 : 1000 =
A: 0.084

Q: 153 : 100 =
A: 1.53

Q: 108 : 100 =
A: 1.08

Q: 68 : 1000 =
A: 0.068

Q: 74 : 100 =
A: 0.74

Q: 237 : 1000 =
A: 0.237

Q: 100 : 100 =
A: 1

Q: 199 : 1000 =
A: 0.199

Q: 244 : 1000 =
A: 0.244

Q: 3 : 10 =
A: 0.3

Q: 76 : 100 =
A: 0.76

Q: 52 : 1000 =
A: 0.052

Q: 145 : 100 =
A: 1.45

Q: 94 : 1000 =
A: 0.094

Q: 229 : 100 =
A: 2.29

Q: 137 : 1000 =
A: 0.137

Q: 212 : 100 =
A: 2.12

Q: 197 : 1000 =
A: 0.197

Q: 53 : 100 =
A: 0.53

Q: 62 : 1000 =
A: 0.062

Q: 218 : 100 =
A: 2.18

Q: 172 : 1000 =
A: 0.172

Q: 141 : 100 =
A: 1.41

Q: 250 : 1000 =
A: 0.25

Q: 50 : 100 =
A: 0.5

Q: 196 : 1000 =
A: 0.196

Q: 199 : 100 =
A: 1.99

Q: 185 : 1000 =
A: 0.185

Q: 85 : 100 =
A: 0.85

Q: 170 : 1000 =
A: 0.17

Q: 216 : 100 =
A: 2.16

Q: 148 : 1000 =
A: 0.148

Q: 205 : 100 =
A: 2.05

Q: 73 : 1000 =
A: 0.073

Q: 221 : 100 =
A: 2.21

Q: 71 : 1000 =
A: 0.071

Q: 106 : 100 =
A: 1.06

Q: 131 : 1000 =
A: 0.131

Q: 205 : 1000 =
A: 0.205

Q: 59 : 100 =
A: 0.59

Q: 55 : 1000 =
A: 0.055

Q: 144 : 1000 =
A: 0.144

Q: 160 : 100 =
A: 1.6

Q: 242 : 1000 =
A: 0.242

Q: 187 : 100 =
A: 1.87

Q: 114 : 100 =
A: 1.14

Q: 60 : 1000 =
A: 0.06

Q: 239 : 100 =
A: 2.39

Q: 50 : 1000 =
A: 0.05

Q: 118 : 100 =
A: 1.18

Q: 249 : 1000 =
A: 0.249

Q: 158 : 100 =
A: 1.58

Q: 122 : 1000 =
A: 0.122

Q: 180 : 100 =
A: 1.8

Q: 140 : 1000 =
A: 0.14

Q: 194 : 1000 =
A: 0.194

Q: 89 : 1000 =
A: 0.089

Q: 210 : 100 =
A: 2.1

Q: 216 : 1000 =
A: 0.216

Q: 105 : 100 =
A: 1.05

Q: 104 : 100 =
A: 1.04

Q: 113 : 1000 =
A: 0.113

Q: 220 : 100 =
A: 2.2

Q: 115 : 1000 =
A: 0.115

Q: 223 : 100 =
A: 2.23

Q: 209 : 1000 =
A: 0.209

Q: 54 : 100 =
A: 0.54

Q: 248 : 1000 =
A: 0.248

Q: 128 : 1000 =
A: 0.128

Q: 225 : 100 =
A: 2.25

Q: 171 : 1000 =
A: 0.171

Q: 159 : 100 =
A: 1.59

Q: 217 : 1000 =
A: 0.217

Q: 101 : 100 =
A: 1.01

Q: 121 : 1000 =
A: 0.121

Q: 236 : 1000 =
A: 0.236

Q: 94 : 100 =
A: 0.94

Q: 56 : 1000 =
A: 0.056

Q: 194 : 100 =
A: 1.94

Q: 168 : 100 =
A: 1.68

Q: 206 : 1000 =
A: 0.206

Q: 139 : 100 =
A: 1.39

Q: 163 : 1000 =
A: 0.163

Q: 57 : 100 =
A: 0.57

Q: 103 : 1000 =
A: 0.103

Q: 155 : 100 =
A: 1.55

Q: 202 : 100 =
A: 2.02

Q: 160 : 1000 =
A: 0.16

Q: 102 : 100 =
A: 1.02

Q: 154 : 1000 =
A: 0.154

Q: 240 : 100 =
A: 2.4

Q: 233 : 100 =
A: 2.33

Q: 78 : 1000 =
A: 0.078

Q: 186 : 1000 =
A: 0.186

Q: 88 : 1000 =
A: 0.088

Q: 234 : 1000 =
A: 0.234

Q: 121 : 100 =
A: 1.21

Q: 130 : 100 =
A: 1.3

Q: 159 : 1000 =
A: 0.159

Q: 209 : 100 =
A: 2.09

Q: 201 : 1000 =
A: 0.201

Q: 239 : 1000 =
A: 0.239

Q: 80 : 1000 =
A: 0.08

Q: 70 : 100 =
A: 0.7

Q: 184 : 100 =
A: 1.84

Q: 155 : 1000 =
A: 0.155

Q: 198 : 100 =
A: 1.98

Q: 222 : 100 =
A: 2.22

Q: 178 : 100 =
A: 1.78

Q: 96 : 1000 =
A: 0.096

Q: 167 : 100 =
A: 1.67

Q: 165 : 1000 =
A: 0.165

Q: 189 : 100 =
A: 1.89

Q: 187 : 1000 =
A: 0.187

Q: 191 : 100 =
A: 1.91

Q: 149 : 100 =
A: 1.49

Q: 157 : 1000 =
A: 0.157

Q: 214 : 1000 =
A: 0.214

Q: 183 : 100 =
A: 1.83

Q: 149 : 1000 =
A: 0.149

Q: 151 : 1000 =
A: 0.151

Q: 109 : 100 =
A: 1.09

Q: 228 : 1000 =
A: 0.228

Q: 95 : 1000 =
A: 0.095

Q: 67 : 100 =
A: 0.67

Q: 87 : 100 =
A: 0.87

Q: 129 : 1000 =
A: 0.129

Q: 78 : 100 =
A: 0.78

Q: 116 : 1000 =
A: 0.116

Q: 117 : 100 =
A: 1.17

Q: 156 : 1000 =
A: 0.156

Q: 72 : 100 =
A: 0.72

Q: 62 : 100 =
A: 0.62

Q: 227 : 100 =
A: 2.27

Q: 119 : 1000 =
A: 0.119

Q: 71 : 100 =
A: 0.71

Q: 234 : 100 =
A: 2.34

Q: 219 : 100 =
A: 2.19

Q: 170 : 100 =
A: 1.7

Q: 108 : 1000 =
A: 0.108

Q: 243 : 100 =
A: 2.43

Q: 127 : 100 =
A: 1.27

Q: 197 : 100 =
A: 1.97

Q: 106 : 1000 =
A: 0.106

Q: 125 : 100 =
A: 1.25

Q: 224 : 100 =
A: 2.24

Q: 214 : 100 =
A: 2.14

Q: 55 : 100 =
A: 0.55

Q: 72 : 1000 =
A: 0.072

Q: 156 : 100 =
A: 1.56

Q: 227 : 1000 =
A: 0.227

Q: 112 : 1000 =
A: 0.112

Q: 200 : 1000 =
A: 0.2

Q: 69 : 100 =
A: 0.69

Q: 175 : 1000 =
A: 0.175

Q: 146 : 1000 =
A: 0.146

Q: 161 : 100 =
A: 1.61

Q: 130 : 1000 =
A: 0.13

Q: 232 : 100 =
A: 2.32

Q: 166 : 100 =
A: 1.66

Q: 136 : 1000 =
A: 0.136

Q: 133 : 100 =
A: 1.33

Q: 65 : 100 =
A: 0.65

Q: 236 : 100 =
A: 2.36

Q: 111 : 1000 =
A: 0.111

Q: 122 : 100 =
A: 1.22

Q: 222 : 1000 =
A: 0.222

Q: 215 : 100 =
A: 2.15

Q: 193 : 1000 =
A: 0.193

Q: 179 : 100 =
A: 1.79

Q: 147 : 1000 =
A: 0.147

Q: 111 : 100 =
A: 1.11

Q: 184 : 1000 =
A: 0.184

Q: 230 : 1000 =
A: 0.23

Q: 152 : 100 =
A: 1.52

Q: 90 : 1000 =
A: 0.09

Q: 136 : 100 =
A: 1.36

Q: 162 : 100 =
A: 1.62

Q: 138 : 1000 =
A: 0.138

Q: 188 : 100 =
A: 1.88

Q: 65 : 1000 =
A: 0.065

Q: 193 : 100 =
A: 1.93

Q: 161 : 1000 =
A: 0.161

Q: 175 : 100 =
A: 1.75

Q: 102 : 1000 =
A: 0.102

Q: 203 : 100 =
A: 2.03

Q: 141 : 1000 =
A: 0.141

Q: 143 : 1000 =
A: 0.143

Q: 126 : 100 =
A: 1.26

Q: 126 : 1000 =
A: 0.126

Q: 246 : 100 =
A: 2.46

Q: 135 : 1000 =
A: 0.135

Q: 135 : 100 =
A: 1.35

Q: 177 : 100 =
A: 1.77

Q: 117 : 1000 =
A: 0.117

Q: 97 : 1000 =
A: 0.097

Q: 66 : 100 =
A: 0.66

Q: 164 : 1000 =
A: 0.164

Q: 152 : 1000 =
A: 0.152

Q: 172 : 100 =
A: 1.72

Q: 150 : 1000 =
A: 0.15

Q: 237 : 100 =
A: 2.37

Q: 89 : 100 =
A: 0.89

Q: 80 : 100 =
A: 0.8

Q: 131 : 100 =
A: 1.31

Q: 59 : 1000 =
A: 0.059

Q: 158 : 1000 =
A: 0.158

Q: 249 : 100 =
A: 2.49

Q: 182 : 100 =
A: 1.82

Q: 100 : 1000 =
A: 0.1

Q: 2 x 0.1 =
A: 0.2

Q: 146 x 0.01 =
A: 1.46

Q: 125 x 0.001 =
A: 0.125

Q: 9 x 0.1 =
A: 0.9

Q: 148 x 0.01 =
A: 1.48

Q: 119 x 0.001 =
A: 0.119

Q: 183 x 0.01 =
A: 1.83

Q: 83 x 0.001 =
A: 0.083

Q: 4 x 0.1 =
A: 0.4

Q: 170 x 0.01 =
A: 1.7

Q: 56 x 0.001 =
A: 0.056

Q: 181 x 0.01 =
A: 1.81

Q: 184 x 0.001 =
A: 0.184

Q: 207 x 0.01 =
A: 2.07

Q: 239 x 0.001 =
A: 0.239

Q: 179 x 0.01 =
A: 1.79

Q: 218 x 0.001 =
A: 0.218

Q: 10 x 0.1 =
A: 1

Q: 149 x 0.01 =
A: 1.49

Q: 3 x 0.1 =
A: 0.3

Q: 102 x 0.01 =
A: 1.02

Q: 104 x 0.001 =
A: 0.104

Q: 8 x 0.1 =
A: 0.8

Q: 117 x 0.01 =
A: 1.17

Q: 60 x 0.001 =
A: 0.06

Q: 134 x 0.01 =
A: 1.34

Q: 102 x 0.001 =
A: 0.102

Q: 186 x 0.01 =
A: 1.86

Q: 112 x 0.001 =
A: 0.112

Q: 249 x 0.01 =
A: 2.49

Q: 244 x 0.001 =
A: 0.244

Q: 6 x 0.1 =
A: 0.6

Q: 200 x 0.01 =
A: 2

Q: 149 x 0.001 =
A: 0.149

Q: 214 x 0.01 =
A: 2.14

Q: 93 x 0.001 =
A: 0.093

Q: 90 x 0.01 =
A: 0.9

Q: 225 x 0.001 =
A: 0.225

Q: 97 x 0.01 =
A: 0.97

Q: 147 x 0.001 =
A: 0.147

Q: 94 x 0.01 =
A: 0.94

Q: 121 x 0.001 =
A: 0.121

Q: 223 x 0.01 =
A: 2.23

Q: 159 x 0.001 =
A: 0.159

Q: 7 x 0.1 =
A: 0.7

Q: 213 x 0.01 =
A: 2.13

Q: 83 x 0.01 =
A: 0.83

Q: 114 x 0.01 =
A: 1.14

Q: 237 x 0.001 =
A: 0.237

Q: 128 x 0.01 =
A: 1.28

Q: 215 x 0.001 =
A: 0.215

Q: 89 x 0.01 =
A: 0.89

Q: 64 x 0.001 =
A: 0.064

Q: 97 x 0.001 =
A: 0.097

Q: 88 x 0.01 =
A: 0.88

Q: 219 x 0.01 =
A: 2.19

Q: 92 x 0.001 =
A: 0.092

Q: 167 x 0.01 =
A: 1.67

Q: 197 x 0.001 =
A: 0.197

Q: 98 x 0.01 =
A: 0.98

Q: 231 x 0.01 =
A: 2.31

Q: 87 x 0.001 =
A: 0.087

Q: 107 x 0.01 =
A: 1.07

Q: 204 x 0.001 =
A: 0.204

Q: 126 x 0.001 =
A: 0.126

Q: 80 x 0.01 =
A: 0.8

Q: 194 x 0.001 =
A: 0.194

Q: 68 x 0.01 =
A: 0.68

Q: 65 x 0.001 =
A: 0.065

Q: 220 x 0.01 =
A: 2.2

Q: 71 x 0.001 =
A: 0.071

Q: 56 x 0.01 =
A: 0.56

Q: 249 x 0.001 =
A: 0.249

Q: 215 x 0.01 =
A: 2.15

Q: 226 x 0.01 =
A: 2.26

Q: 167 x 0.001 =
A: 0.167

Q: 244 x 0.01 =
A: 2.44

Q: 224 x 0.001 =
A: 0.224

Q: 111 x 0.01 =
A: 1.11

Q: 205 x 0.001 =
A: 0.205

Q: 175 x 0.01 =
A: 1.75

Q: 180 x 0.001 =
A: 0.18

Q: 235 x 0.01 =
A: 2.35

Q: 70 x 0.001 =
A: 0.07

Q: 130 x 0.01 =
A: 1.3

Q: 88 x 0.001 =
A: 0.088

Q: 113 x 0.01 =
A: 1.13

Q: 61 x 0.001 =
A: 0.061

Q: 103 x 0.01 =
A: 1.03

Q: 217 x 0.001 =
A: 0.217

Q: 5 x 0.1 =
A: 0.5

Q: 125 x 0.01 =
A: 1.25

Q: 184 x 0.01 =
A: 1.84

Q: 164 x 0.001 =
A: 0.164

Q: 229 x 0.001 =
A: 0.229

Q: 91 x 0.01 =
A: 0.91

Q: 59 x 0.001 =
A: 0.059

Q: 76 x 0.01 =
A: 0.76

Q: 231 x 0.001 =
A: 0.231

Q: 223 x 0.001 =
A: 0.223

Q: 243 x 0.01 =
A: 2.43

Q: 99 x 0.01 =
A: 0.99

Q: 176 x 0.001 =
A: 0.176

Q: 123 x 0.01 =
A: 1.23

Q: 193 x 0.001 =
A: 0.193

Q: 194 x 0.01 =
A: 1.94

Q: 189 x 0.001 =
A: 0.189

Q: 130 x 0.001 =
A: 0.13

Q: 174 x 0.01 =
A: 1.74

Q: 53 x 0.01 =
A: 0.53

Q: 117 x 0.001 =
A: 0.117

Q: 108 x 0.01 =
A: 1.08

Q: 144 x 0.001 =
A: 0.144

Q: 153 x 0.001 =
A: 0.153

Q: 70 x 0.01 =
A: 0.7

Q: 139 x 0.01 =
A: 1.39

Q: 73 x 0.01 =
A: 0.73

Q: 198 x 0.01 =
A: 1.98

Q: 157 x 0.001 =
A: 0.157

Q: 77 x 0.01 =
A: 0.77

Q: 124 x 0.001 =
A: 0.124

Q: 150 x 0.01 =
A: 1.5

Q: 195 x 0.01 =
A: 1.95

Q: 145 x 0.01 =
A: 1.45

Q: 203 x 0.001 =
A: 0.203

Q: 247 x 0.01 =
A: 2.47

Q: 186 x 0.001 =
A: 0.186

Q: 78 x 0.01 =
A: 0.78

Q: 86 x 0.01 =
A: 0.86

Q: 230 x 0.001 =
A: 0.23

Q: 122 x 0.001 =
A: 0.122

Q: 69 x 0.01 =
A: 0.69

Q: 89 x 0.001 =
A: 0.089

Q: 209 x 0.01 =
A: 2.09

Q: 178 x 0.001 =
A: 0.178

Q: 206 x 0.01 =
A: 2.06

Q: 136 x 0.001 =
A: 0.136

Q: 154 x 0.01 =
A: 1.54

Q: 221 x 0.001 =
A: 0.221

Q: 221 x 0.01 =
A: 2.21

Q: 248 x 0.01 =
A: 2.48

Q: 160 x 0.001 =
A: 0.16

Q: 105 x 0.01 =
A: 1.05

Q: 181 x 0.001 =
A: 0.181

Q: 199 x 0.001 =
A: 0.199

Q: 201 x 0.01 =
A: 2.01

Q: 84 x 0.001 =
A: 0.084

Q: 66 x 0.01 =
A: 0.66

Q: 106 x 0.001 =
A: 0.106

Q: 104 x 0.01 =
A: 1.04

Q: 242 x 0.001 =
A: 0.242

Q: 133 x 0.01 =
A: 1.33

Q: 226 x 0.001 =
A: 0.226

Q: 230 x 0.01 =
A: 2.3

Q: 51 x 0.001 =
A: 0.051

Q: 196 x 0.001 =
A: 0.196

Q: 73 x 0.001 =
A: 0.073

Q: 57 x 0.01 =
A: 0.57

Q: 145 x 0.001 =
A: 0.145

Q: 98 x 0.001 =
A: 0.098

Q: 196 x 0.01 =
A: 1.96

Q: 245 x 0.001 =
A: 0.245

Q: 122 x 0.01 =
A: 1.22

Q: 192 x 0.001 =
A: 0.192

Q: 234 x 0.01 =
A: 2.34

Q: 233 x 0.001 =
A: 0.233

Q: 216 x 0.001 =
A: 0.216

Q: 165 x 0.001 =
A: 0.165

Q: 240 x 0.001 =
A: 0.24

Q: 61 x 0.01 =
A: 0.61

Q: 77 x 0.001 =
A: 0.077

Q: 153 x 0.01 =
A: 1.53

Q: 152 x 0.001 =
A: 0.152

Q: 165 x 0.01 =
A: 1.65

Q: 72 x 0.001 =
A: 0.072

Q: 218 x 0.01 =
A: 2.18

Q: 82 x 0.001 =
A: 0.082

Q: 82 x 0.01 =
A: 0.82

Q: 172 x 0.001 =
A: 0.172

Q: 176 x 0.01 =
A: 1.76

Q: 121 x 0.01 =
A: 1.21

Q: 174 x 0.001 =
A: 0.174

Q: 224 x 0.01 =
A: 2.24

Q: 131 x 0.01 =
A: 1.31

Q: 81 x 0.01 =
A: 0.81

Q: 54 x 0.001 =
A: 0.054

Q: 193 x 0.01 =
A: 1.93

Q: 58 x 0.001 =
A: 0.058

Q: 114 x 0.001 =
A: 0.114

Q: 92 x 0.01 =
A: 0.92

Q: 182 x 0.001 =
A: 0.182

Q: 210 x 0.001 =
A: 0.21

Q: 178 x 0.01 =
A: 1.78

Q: 124 x 0.01 =
A: 1.24

Q: 139 x 0.001 =
A: 0.139

Q: 217 x 0.01 =
A: 2.17

Q: 55 x 0.001 =
A: 0.055

Q: 241 x 0.01 =
A: 2.41

Q: 168 x 0.001 =
A: 0.168

Q: 208 x 0.01 =
A: 2.08

Q: 141 x 0.001 =
A: 0.141

Q: 233 x 0.01 =
A: 2.33

Q: 80 x 0.001 =
A: 0.08

Q: 236 x 0.01 =
A: 2.36

Q: 183 x 0.001 =
A: 0.183

Q: 109 x 0.01 =
A: 1.09

Q: 63 x 0.01 =
A: 0.63

Q: 75 x 0.001 =
A: 0.075

Q: 148 x 0.001 =
A: 0.148

Q: 59 x 0.01 =
A: 0.59

Q: 91 x 0.001 =
A: 0.091

Q: 86 x 0.001 =
A: 0.086

Q: 138 x 0.01 =
A: 1.38

Q: 238 x 0.001 =
A: 0.238

Q: 166 x 0.001 =
A: 0.166

Q: 199 x 0.01 =
A: 1.99

Q: 191 x 0.001 =
A: 0.191

Q: 85 x 0.001 =
A: 0.085

Q: 100 x 0.01 =
A: 1

Q: 135 x 0.001 =
A: 0.135

Q: 246 x 0.001 =
A: 0.246

Q: 93 x 0.01 =
A: 0.93

Q: 152 x 0.01 =
A: 1.52

Q: 156 x 0.001 =
A: 0.156

Q: 191 x 0.01 =
A: 1.91

Q: 235 x 0.001 =
A: 0.235

Q: 116 x 0.01 =
A: 1.16

Q: 116 x 0.001 =
A: 0.116

Q: 202 x 0.01 =
A: 2.02

Q: 101 x 0.001 =
A: 0.101

Q: 127 x 0.01 =
A: 1.27

Q: 67 x 0.01 =
A: 0.67

Q: 227 x 0.001 =
A: 0.227

Q: 190 x 0.01 =
A: 1.9

Q: 163 x 0.001 =
A: 0.163

Q: 200 x 0.001 =
A: 0.2

Q: 246 x 0.01 =
A: 2.46

Q: 109 x 0.001 =
A: 0.109

Q: 163 x 0.01 =
A: 1.63

Q: 120 x 0.001 =
A: 0.12

Q: 175 x 0.001 =
A: 0.175

Q: 123 x 0.001 =
A: 0.123

Q: 192 x 0.01 =
A: 1.92

Q: 187 x 0.01 =
A: 1.87

Q: 173 x 0.001 =
A: 0.173

Q: 134 x 0.001 =
A: 0.134

Q: 197 x 0.01 =
A: 1.97

Q: 90 x 0.001 =
A: 0.09

Q: 238 x 0.01 =
A: 2.38

Q: 78 x 0.001 =
A: 0.078

Q: 84 x 0.01 =
A: 0.84

Q: 236 x 0.001 =
A: 0.236

Q: 147 x 0.01 =
A: 1.47

Q: 146 x 0.001 =
A: 0.146

Q: 144 x 0.01 =
A: 1.44

Q: 169 x 0.01 =
A: 1.69

Q: 131 x 0.001 =
A: 0.131

Q: 74 x 0.001 =
A: 0.074