Title: delen tiendelige breuken
Course: Rekenregels 8

Q: 0.066 : 0.6 =
A: 0.11

Q: 0.224 : 0.08 =
A: 2.8

Q: 3.76 : 0.8 =
A: 4.7

Q: 7.4 : 0.2 =
A: 37

Q: 0.144 : 0.04 =
A: 3.6

Q: 0.344 : 0.8 =
A: 0.43

Q: 0.245 : 0.7 =
A: 0.35

Q: 0.168 : 0.07 =
A: 2.4

Q: 2.24 : 0.8 =
A: 2.8

Q: 11.2 : 0.7 =
A: 16

Q: 0.387 : 0.09 =
A: 4.3

Q: 0.033 : 0.1 =
A: 0.33

Q: 0.147 : 0.7 =
A: 0.21

Q: 0.25 : 0.05 =
A: 5

Q: 2.72 : 0.8 =
A: 3.4

Q: 8.6 : 0.2 =
A: 43

Q: 0.3 : 0.06 =
A: 5

Q: 0.3 : 0.6 =
A: 0.5

Q: 0.023 : 0.1 =
A: 0.23

Q: 0.112 : 0.08 =
A: 1.4

Q: 3.06 : 0.9 =
A: 3.4

Q: 2.4 : 0.2 =
A: 12

Q: 0.304 : 0.08 =
A: 3.8

Q: 0.156 : 0.4 =
A: 0.39

Q: 0.28 : 0.8 =
A: 0.35

Q: 0.245 : 0.07 =
A: 3.5

Q: 0.21 : 0.1 =
A: 2.1

Q: 18 : 0.6 =
A: 30

Q: 0.161 : 0.07 =
A: 2.3

Q: 0.342 : 0.9 =
A: 0.38

Q: 0.078 : 0.2 =
A: 0.39

Q: 0.081 : 0.03 =
A: 2.7

Q: 4.14 : 0.9 =
A: 4.6

Q: 14 : 0.7 =
A: 20

Q: 0.222 : 0.06 =
A: 3.7

Q: 0.014 : 0.1 =
A: 0.14

Q: 0.07 : 0.5 =
A: 0.14

Q: 0.23 : 0.05 =
A: 4.6

Q: 1.6 : 0.4 =
A: 4

Q: 9.2 : 0.2 =
A: 46

Q: 0.09 : 0.09 =
A: 1

Q: 0.378 : 0.9 =
A: 0.42

Q: 0.28 : 1 =
A: 0.28

Q: 0.2 : 0.1 =
A: 2

Q: 0.2 : 0.2 =
A: 1

Q: 25 : 1 =
A: 25

Q: 0.035 : 0.01 =
A: 3.5

Q: 0.19 : 1 =
A: 0.19

Q: 0.036 : 0.1 =
A: 0.36

Q: 0.112 : 0.07 =
A: 1.6

Q: 0.44 : 0.1 =
A: 4.4

Q: 13.2 : 0.3 =
A: 44

Q: 0.138 : 0.06 =
A: 2.3

Q: 0.252 : 0.9 =
A: 0.28

Q: 0.049 : 0.1 =
A: 0.49

Q: 0.36 : 0.09 =
A: 4

Q: 0.8 : 0.5 =
A: 1.6

Q: 7.5 : 0.3 =
A: 25

Q: 0.392 : 0.08 =
A: 4.9

Q: 0.259 : 0.7 =
A: 0.37

Q: 0.273 : 0.7 =
A: 0.39

Q: 0.24 : 0.06 =
A: 4

Q: 1.25 : 0.5 =
A: 2.5

Q: 10.2 : 0.3 =
A: 34

Q: 0.145 : 0.05 =
A: 2.9

Q: 0.048 : 0.1 =
A: 0.48

Q: 0.195 : 0.5 =
A: 0.39

Q: 0.46 : 0.1 =
A: 4.6

Q: 1.56 : 0.4 =
A: 3.9

Q: 26 : 1 =
A: 26

Q: 0.14 : 0.07 =
A: 2

Q: 0.054 : 0.3 =
A: 0.18

Q: 0.024 : 0.2 =
A: 0.12

Q: 0.138 : 0.03 =
A: 4.6

Q: 1.64 : 0.4 =
A: 4.1

Q: 30.8 : 0.7 =
A: 44

Q: 0.287 : 0.07 =
A: 4.1

Q: 0.43 : 1 =
A: 0.43

Q: 0.14 : 0.5 =
A: 0.28

Q: 0.196 : 0.04 =
A: 4.9

Q: 2.73 : 0.7 =
A: 3.9

Q: 41.4 : 0.9 =
A: 46

Q: 0.156 : 0.06 =
A: 2.6

Q: 0.25 : 0.5 =
A: 0.5

Q: 0.082 : 0.2 =
A: 0.41

Q: 0.38 : 0.1 =
A: 3.8

Q: 0.75 : 0.3 =
A: 2.5

Q: 14 : 0.4 =
A: 35

Q: 0.414 : 0.09 =
A: 4.6

Q: 0.2 : 0.4 =
A: 0.5

Q: 0.117 : 0.9 =
A: 0.13

Q: 0.054 : 0.02 =
A: 2.7

Q: 0.68 : 0.2 =
A: 3.4

Q: 8.8 : 0.4 =
A: 22

Q: 0.128 : 0.08 =
A: 1.6

Q: 0.3 : 1 =
A: 0.3

Q: 0.056 : 0.2 =
A: 0.28

Q: 0.063 : 0.03 =
A: 2.1

Q: 3.15 : 0.9 =
A: 3.5

Q: 1.3 : 0.1 =
A: 13

Q: 0.12 : 0.08 =
A: 1.5

Q: 0.41 : 1 =
A: 0.41

Q: 0.225 : 0.9 =
A: 0.25

Q: 0.144 : 0.08 =
A: 1.8

Q: 1.76 : 0.8 =
A: 2.2

Q: 3.9 : 0.3 =
A: 13

Q: 0.028 : 0.01 =
A: 2.8

Q: 0.266 : 0.7 =
A: 0.38

Q: 0.037 : 0.1 =
A: 0.37

Q: 0.051 : 0.03 =
A: 1.7

Q: 0.5 : 0.5 =
A: 1

Q: 4 : 0.1 =
A: 40

Q: 0.084 : 0.02 =
A: 4.2

Q: 0.405 : 0.9 =
A: 0.45

Q: 0.12 : 0.8 =
A: 0.15

Q: 0.195 : 0.05 =
A: 3.9

Q: 0.88 : 0.4 =
A: 2.2

Q: 0.125 : 0.05 =
A: 2.5

Q: 0.18 : 0.6 =
A: 0.3

Q: 0.176 : 0.4 =
A: 0.44

Q: 0.164 : 0.04 =
A: 4.1

Q: 1.44 : 0.9 =
A: 1.6

Q: 35 : 0.7 =
A: 50

Q: 0.273 : 0.07 =
A: 3.9

Q: 0.084 : 0.6 =
A: 0.14

Q: 0.228 : 0.6 =
A: 0.38

Q: 0.12 : 0.04 =
A: 3

Q: 2.97 : 0.9 =
A: 3.3

Q: 35 : 1 =
A: 35

Q: 0.32 : 0.1 =
A: 3.2

Q: 0.06 : 0.5 =
A: 0.12

Q: 0.096 : 0.6 =
A: 0.16

Q: 0.029 : 0.01 =
A: 2.9

Q: 0.3 : 0.3 =
A: 1

Q: 12.6 : 0.3 =
A: 42

Q: 0.324 : 0.09 =
A: 3.6

Q: 0.154 : 0.7 =
A: 0.22

Q: 0.44 : 1 =
A: 0.44

Q: 0.087 : 0.03 =
A: 2.9

Q: 1.2 : 0.5 =
A: 2.4

Q: 4.4 : 0.1 =
A: 44

Q: 0.092 : 0.02 =
A: 4.6

Q: 0.08 : 0.8 =
A: 0.1

Q: 0.5 : 1 =
A: 0.5

Q: 0.07 : 0.05 =
A: 1.4

Q: 0.87 : 0.3 =
A: 2.9

Q: 4.2 : 0.2 =
A: 21

Q: 0.168 : 0.08 =
A: 2.1

Q: 0.28 : 0.7 =
A: 0.4

Q: 0.174 : 0.6 =
A: 0.29

Q: 0.24 : 0.08 =
A: 3

Q: 2.79 : 0.9 =
A: 3.1

Q: 4.8 : 0.3 =
A: 16

Q: 0.301 : 0.07 =
A: 4.3

Q: 0.148 : 0.4 =
A: 0.37

Q: 0.092 : 0.4 =
A: 0.23

Q: 0.024 : 0.02 =
A: 1.2

Q: 1.41 : 0.3 =
A: 4.7

Q: 8 : 0.5 =
A: 16

Q: 0.055 : 0.05 =
A: 1.1

Q: 0.11 : 1 =
A: 0.11

Q: 0.168 : 0.8 =
A: 0.21

Q: 0.099 : 0.09 =
A: 1.1

Q: 0.65 : 0.5 =
A: 1.3

Q: 10.5 : 0.5 =
A: 21

Q: 0.063 : 0.3 =
A: 0.21

Q: 0.264 : 0.6 =
A: 0.44

Q: 0.165 : 0.05 =
A: 3.3

Q: 0.54 : 0.2 =
A: 2.7

Q: 14.4 : 0.3 =
A: 48

Q: 0.35 : 0.1 =
A: 3.5

Q: 0.039 : 0.3 =
A: 0.13

Q: 0.135 : 0.05 =
A: 2.7

Q: 0.41 : 0.1 =
A: 4.1

Q: 0.336 : 0.08 =
A: 4.2

Q: 0.03 : 0.1 =
A: 0.3

Q: 0.176 : 0.8 =
A: 0.22

Q: 1.6 : 0.8 =
A: 2

Q: 20 : 0.5 =
A: 40

Q: 0.096 : 0.02 =
A: 4.8

Q: 0.088 : 0.4 =
A: 0.22

Q: 0.21 : 0.7 =
A: 0.3

Q: 0.342 : 0.09 =
A: 3.8

Q: 3.24 : 0.9 =
A: 3.6

Q: 37.8 : 0.9 =
A: 42

Q: 0.336 : 0.8 =
A: 0.42

Q: 0.21 : 0.5 =
A: 0.42

Q: 0.14 : 0.05 =
A: 2.8

Q: 0.81 : 0.3 =
A: 2.7

Q: 28.2 : 0.6 =
A: 47

Q: 0.09 : 0.05 =
A: 1.8

Q: 0.376 : 0.8 =
A: 0.47

Q: 0.264 : 0.08 =
A: 3.3

Q: 0.36 : 0.1 =
A: 3.6

Q: 3.5 : 0.1 =
A: 35

Q: 0.024 : 0.01 =
A: 2.4

Q: 0.238 : 0.7 =
A: 0.34

Q: 0.084 : 0.3 =
A: 0.28

Q: 0.1 : 0.05 =
A: 2

Q: 2.88 : 0.6 =
A: 4.8

Q: 6 : 0.4 =
A: 15

Q: 0.12 : 0.1 =
A: 1.2

Q: 0.047 : 0.1 =
A: 0.47

Q: 0.47 : 1 =
A: 0.47

Q: 0.102 : 0.03 =
A: 3.4

Q: 0.5 : 0.2 =
A: 2.5

Q: 0.011 : 0.01 =
A: 1.1

Q: 0.15 : 0.5 =
A: 0.3

Q: 0.35 : 1 =
A: 0.35

Q: 1.8 : 0.5 =
A: 3.6

Q: 33.6 : 0.8 =
A: 42

Q: 0.092 : 0.04 =
A: 2.3

Q: 0.22 : 1 =
A: 0.22

Q: 0.196 : 0.7 =
A: 0.28

Q: 0.026 : 0.01 =
A: 2.6

Q: 4.1 : 0.1 =
A: 41

Q: 0.216 : 0.06 =
A: 3.6

Q: 0.042 : 0.2 =
A: 0.21

Q: 0.075 : 0.5 =
A: 0.15

Q: 0.114 : 0.06 =
A: 1.9

Q: 1.82 : 0.7 =
A: 2.6

Q: 15.6 : 0.6 =
A: 26

Q: 0.17 : 0.05 =
A: 3.4

Q: 0.1 : 0.4 =
A: 0.25

Q: 0.108 : 0.6 =
A: 0.18

Q: 0.192 : 0.06 =
A: 3.2

Q: 3 : 0.6 =
A: 5

Q: 1.5 : 0.1 =
A: 15

Q: 0.126 : 0.03 =
A: 4.2

Q: 0.387 : 0.9 =
A: 0.43

Q: 0.018 : 0.1 =
A: 0.18

Q: 0.056 : 0.04 =
A: 1.4

Q: 2.24 : 0.7 =
A: 3.2

Q: 0.033 : 0.01 =
A: 3.3

Q: 0.15 : 0.3 =
A: 0.5

Q: 0.152 : 0.4 =
A: 0.38

Q: 0.207 : 0.09 =
A: 2.3

Q: 0.84 : 0.7 =
A: 1.2

Q: 9.8 : 0.2 =
A: 49

Q: 0.172 : 0.04 =
A: 4.3

Q: 0.15 : 1 =
A: 0.15

Q: 0.06 : 0.4 =
A: 0.15

Q: 0.376 : 0.08 =
A: 4.7

Q: 2.17 : 0.7 =
A: 3.1

Q: 37 : 1 =
A: 37

Q: 0.148 : 0.04 =
A: 3.7

Q: 0.396 : 0.9 =
A: 0.44

Q: 0.042 : 0.02 =
A: 2.1

Q: 0.66 : 0.6 =
A: 1.1

Q: 0.184 : 0.04 =
A: 4.6

Q: 0.035 : 0.1 =
A: 0.35

Q: 0.144 : 0.6 =
A: 0.24

Q: 0.31 : 0.1 =
A: 3.1

Q: 1.62 : 0.9 =
A: 1.8

Q: 34.4 : 0.8 =
A: 43

Q: 0.216 : 0.9 =
A: 0.24

Q: 0.03 : 0.03 =
A: 1

Q: 2.07 : 0.9 =
A: 2.3

Q: 24.5 : 0.7 =
A: 35

Q: 0.34 : 0.1 =
A: 3.4

Q: 0.18 : 0.9 =
A: 0.2

Q: 0.09 : 0.3 =
A: 0.3

Q: 0.038 : 0.01 =
A: 3.8

Q: 0.6 : 0.4 =
A: 1.5

Q: 4.3 : 0.1 =
A: 43

Q: 0.037 : 0.01 =
A: 3.7

Q: 0.288 : 0.9 =
A: 0.32

Q: 0.414 : 0.9 =
A: 0.46

Q: 0.132 : 0.04 =
A: 3.3

Q: 2.9 : 1 =
A: 2.9

Q: 7.8 : 0.3 =
A: 26

Q: 0.168 : 0.04 =
A: 4.2

Q: 0.077 : 0.7 =
A: 0.11

Q: 0.36 : 1 =
A: 0.36

Q: 0.105 : 0.03 =
A: 3.5

Q: 2.52 : 0.6 =
A: 4.2

Q: 39 : 1 =
A: 39

Q: 0.288 : 0.8 =
A: 0.36

Q: 0.96 : 0.2 =
A: 4.8

Q: 5.6 : 0.2 =
A: 28

Q: 0.017 : 0.01 =
A: 1.7

Q: 0.058 : 0.2 =
A: 0.29

Q: 0.125 : 0.5 =
A: 0.25

Q: 0.075 : 0.03 =
A: 2.5

Q: 8 : 0.2 =
A: 40

Q: 0.025 : 0.01 =
A: 2.5

Q: 0.12 : 0.6 =
A: 0.2

Q: 0.24 : 0.8 =
A: 0.3

Q: 0.252 : 0.07 =
A: 3.6

Q: 0.5 : 0.1 =
A: 5

Q: 38 : 1 =
A: 38

Q: 0.128 : 0.04 =
A: 3.2

Q: 0.25 : 1 =
A: 0.25

Q: 0.14 : 0.7 =
A: 0.2

Q: 0.1 : 0.02 =
A: 5

Q: 1.2 : 0.4 =
A: 3

Q: 13.2 : 0.4 =
A: 33

Q: 0.036 : 0.03 =
A: 1.2

Q: 0.4 : 0.8 =
A: 0.5

Q: 0.098 : 0.07 =
A: 1.4

Q: 4.2 : 1 =
A: 4.2

Q: 5 : 0.2 =
A: 25

Q: 0.18 : 0.04 =
A: 4.5

Q: 0.336 : 0.7 =
A: 0.48

Q: 0.9 : 0.2 =
A: 4.5

Q: 31 : 1 =
A: 31

Q: 0.132 : 0.06 =
A: 2.2

Q: 0.072 : 0.04 =
A: 1.8

Q: 1.4 : 0.7 =
A: 2

Q: 0.18 : 0.09 =
A: 2

Q: 0.175 : 0.7 =
A: 0.25

Q: 0.16 : 0.05 =
A: 3.2

Q: 1.65 : 0.5 =
A: 3.3

Q: 26.1 : 0.9 =
A: 29

Q: 0.19 : 0.05 =
A: 3.8

Q: 0.031 : 0.1 =
A: 0.31

Q: 0.096 : 0.4 =
A: 0.24

Q: 0.216 : 0.08 =
A: 2.7

Q: 0.84 : 0.4 =
A: 2.1

Q: 0.17 : 0.5 =
A: 0.34

Q: 0.034 : 0.1 =
A: 0.34

Q: 1.26 : 0.7 =
A: 1.8

Q: 17.1 : 0.9 =
A: 19

Q: 0.066 : 0.02 =
A: 3.3

Q: 0.021 : 0.1 =
A: 0.21

Q: 0.048 : 0.02 =
A: 2.4

Q: 2.28 : 0.6 =
A: 3.8

Q: 0.15 : 0.1 =
A: 1.5

Q: 0.084 : 0.7 =
A: 0.12

Q: 0.09 : 0.2 =
A: 0.45

Q: 0.288 : 0.08 =
A: 3.6

Q: 38.4 : 0.8 =
A: 48

Q: 0.306 : 0.09 =
A: 3.4

Q: 0.132 : 0.4 =
A: 0.33

Q: 0.17 : 1 =
A: 0.17

Q: 0.078 : 0.03 =
A: 2.6

Q: 11.4 : 0.3 =
A: 38

Q: 0.33 : 0.1 =
A: 3.3

Q: 0.132 : 0.6 =
A: 0.22

Q: 0.207 : 0.9 =
A: 0.23

Q: 0.036 : 0.01 =
A: 3.6

Q: 29.4 : 0.6 =
A: 49

Q: 0.028 : 0.2 =
A: 0.14

Q: 0.155 : 0.5 =
A: 0.31

Q: 0.034 : 0.02 =
A: 1.7

Q: 0.234 : 0.06 =
A: 3.9

Q: 2 : 0.4 =
A: 5

Q: 11.5 : 0.5 =
A: 23

Q: 0.288 : 0.09 =
A: 3.2

Q: 0.091 : 0.7 =
A: 0.13

Q: 0.135 : 0.03 =
A: 4.5

Q: 1.12 : 0.8 =
A: 1.4

Q: 10 : 1 =
A: 10

Q: 0.252 : 0.09 =
A: 2.8

Q: 0.032 : 0.1 =
A: 0.32

Q: 0.168 : 0.7 =
A: 0.24

Q: 0.032 : 0.01 =
A: 3.2

Q: 0.4 : 0.1 =
A: 4

Q: 14.1 : 0.3 =
A: 47

Q: 0.11 : 0.5 =
A: 0.22

Q: 0.06 : 0.2 =
A: 0.3

Q: 0.43 : 0.1 =
A: 4.3

Q: 22 : 1 =
A: 22

Q: 0.023 : 0.01 =
A: 2.3

Q: 0.441 : 0.09 =
A: 4.9

Q: 1.32 : 0.4 =
A: 3.3

Q: 2.3 : 0.1 =
A: 23

Q: 0.196 : 0.07 =
A: 2.8

Q: 0.052 : 0.2 =
A: 0.26

Q: 0.013 : 0.01 =
A: 1.3

Q: 1.28 : 0.4 =
A: 3.2

Q: 0.1 : 1 =
A: 0.1

Q: 0.108 : 0.9 =
A: 0.12

Q: 0.297 : 0.09 =
A: 3.3

Q: 5 : 1 =
A: 5

Q: 0.22 : 0.1 =
A: 2.2

Q: 0.022 : 0.1 =
A: 0.22

Q: 0.243 : 0.9 =
A: 0.27

Q: 0.16 : 0.1 =
A: 1.6

Q: 3.9 : 0.1 =
A: 39

Q: 0.16 : 1 =
A: 0.16

Q: 0.085 : 0.5 =
A: 0.17

Q: 0.186 : 0.06 =
A: 3.1

Q: 0.32 : 0.2 =
A: 1.6

Q: 31.5 : 0.9 =
A: 35

Q: 0.252 : 0.7 =
A: 0.36

Q: 0.036 : 0.3 =
A: 0.12

Q: 0.108 : 0.06 =
A: 1.8

Q: 1 : 0.5 =
A: 2

Q: 0.027 : 0.01 =
A: 2.7

Q: 0.31 : 1 =
A: 0.31

Q: 0.066 : 0.2 =
A: 0.33

Q: 1.38 : 0.3 =
A: 4.6

Q: 0.22 : 0.05 =
A: 4.4

Q: 0.14 : 1 =
A: 0.14

Q: 0.2 : 0.08 =
A: 2.5

Q: 20.4 : 0.6 =
A: 34

Q: 0.111 : 0.03 =
A: 3.7

Q: 0.39 : 1 =
A: 0.39

Q: 0.27 : 0.06 =
A: 4.5

Q: 0.72 : 0.4 =
A: 1.8

Q: 2.2 : 0.2 =
A: 11

Q: 0.084 : 0.03 =
A: 2.8

Q: 0.198 : 0.6 =
A: 0.33

Q: 0.096 : 0.3 =
A: 0.32

Q: 17.6 : 0.8 =
A: 22

Q: 0.046 : 0.2 =
A: 0.23

Q: 1.17 : 0.9 =
A: 1.3

Q: 3.2 : 0.2 =
A: 16

Q: 0.368 : 0.08 =
A: 4.6

Q: 0.04 : 0.1 =
A: 0.4

Q: 0.015 : 0.1 =
A: 0.15

Q: 2.1 : 0.6 =
A: 3.5

Q: 12 : 0.3 =
A: 40

Q: 0.092 : 0.2 =
A: 0.46

Q: 0.144 : 0.4 =
A: 0.36

Q: 0.07 : 0.07 =
A: 1

Q: 0.52 : 0.4 =
A: 1.3

Q: 22.5 : 0.5 =
A: 45

Q: 0.182 : 0.7 =
A: 0.26

Q: 0.171 : 0.09 =
A: 1.9

Q: 3.36 : 0.7 =
A: 4.8

Q: 2.5 : 0.1 =
A: 25

Q: 0.075 : 0.05 =
A: 1.5

Q: 0.068 : 0.4 =
A: 0.17

Q: 0.248 : 0.8 =
A: 0.31

Q: 0.021 : 0.01 =
A: 2.1

Q: 1.2 : 0.8 =
A: 1.5

Q: 20.3 : 0.7 =
A: 29

Q: 0.405 : 0.09 =
A: 4.5

Q: 0.115 : 0.5 =
A: 0.23

Q: 0.47 : 0.1 =
A: 4.7

Q: 0.39 : 0.1 =
A: 3.9

Q: 39.2 : 0.8 =
A: 49

Q: 0.153 : 0.9 =
A: 0.17

Q: 0.27 : 0.1 =
A: 2.7

Q: 7.8 : 0.2 =
A: 39

Q: 0.088 : 0.8 =
A: 0.11

Q: 0.072 : 0.3 =
A: 0.24

Q: 0.228 : 0.06 =
A: 3.8

Q: 1.05 : 0.7 =
A: 1.5

Q: 0.105 : 0.3 =
A: 0.35

Q: 0.256 : 0.08 =
A: 3.2

Q: 3.3 : 1 =
A: 3.3

Q: 16.2 : 0.6 =
A: 27

Q: 0.261 : 0.09 =
A: 2.9

Q: 0.441 : 0.9 =
A: 0.49

Q: 2.2 : 1 =
A: 2.2

Q: 10.8 : 0.3 =
A: 36

Q: 0.06 : 0.05 =
A: 1.2

Q: 0.123 : 0.3 =
A: 0.41

Q: 0.03 : 0.2 =
A: 0.15

Q: 0.043 : 0.01 =
A: 4.3

Q: 1.1 : 1 =
A: 1.1

Q: 0.112 : 0.04 =
A: 2.8

Q: 0.099 : 0.3 =
A: 0.33

Q: 0.026 : 0.1 =
A: 0.26

Q: 0.235 : 0.05 =
A: 4.7

Q: 0.95 : 0.5 =
A: 1.9

Q: 0.084 : 0.2 =
A: 0.42

Q: 0.29 : 1 =
A: 0.29

Q: 2.66 : 0.7 =
A: 3.8

Q: 5.1 : 0.3 =
A: 17

Q: 0.23 : 0.1 =
A: 2.3

Q: 0.13 : 0.5 =
A: 0.26

Q: 0.08 : 0.05 =
A: 1.6

Q: 1.08 : 0.6 =
A: 1.8

Q: 19.2 : 0.6 =
A: 32

Q: 0.264 : 0.06 =
A: 4.4

Q: 0.245 : 0.05 =
A: 4.9

Q: 16 : 0.8 =
A: 20

Q: 0.034 : 0.2 =
A: 0.17

Q: 0.088 : 0.02 =
A: 4.4

Q: 25.6 : 0.8 =
A: 32

Q: 0.165 : 0.5 =
A: 0.33

Q: 0.204 : 0.06 =
A: 3.4

Q: 42 : 1 =
A: 42

Q: 0.12 : 0.03 =
A: 4

Q: 3.7 : 1 =
A: 3.7

Q: 12.9 : 0.3 =
A: 43

Q: 0.15 : 0.05 =
A: 3

Q: 0.57 : 0.3 =
A: 1.9

Q: 29.7 : 0.9 =
A: 33

Q: 0.096 : 0.04 =
A: 2.4

Q: 0.095 : 0.5 =
A: 0.19

Q: 0.096 : 0.8 =
A: 0.12

Q: 0.14 : 0.04 =
A: 3.5

Q: 0.72 : 0.2 =
A: 3.6

Q: 30.6 : 0.9 =
A: 34

Q: 0.258 : 0.06 =
A: 4.3

Q: 0.324 : 0.9 =
A: 0.36

Q: 15.3 : 0.9 =
A: 17

Q: 0.147 : 0.07 =
A: 2.1

Q: 0.28 : 0.07 =
A: 4

Q: 1.9 : 1 =
A: 1.9

Q: 6 : 0.6 =
A: 10

Q: 0.045 : 0.3 =
A: 0.15

Q: 0.07 : 0.02 =
A: 3.5

Q: 10.5 : 0.7 =
A: 15

Q: 0.128 : 0.4 =
A: 0.32

Q: 0.026 : 0.2 =
A: 0.13

Q: 8.5 : 0.5 =
A: 17

Q: 0.086 : 0.02 =
A: 4.3

Q: 0.076 : 0.2 =
A: 0.38

Q: 0.108 : 0.3 =
A: 0.36

Q: 0.144 : 0.06 =
A: 2.4

Q: 3.2 : 0.8 =
A: 4

Q: 15.5 : 0.5 =
A: 31

Q: 0.105 : 0.05 =
A: 2.1

Q: 0.21 : 1 =
A: 0.21

Q: 0.37 : 0.1 =
A: 3.7

Q: 2.8 : 1 =
A: 2.8

Q: 10.8 : 0.4 =
A: 27

Q: 0.189 : 0.7 =
A: 0.27

Q: 0.217 : 0.7 =
A: 0.31

Q: 0.108 : 0.04 =
A: 2.7

Q: 1.5 : 0.3 =
A: 5

Q: 5.6 : 0.4 =
A: 14

Q: 0.018 : 0.01 =
A: 1.8

Q: 0.423 : 0.9 =
A: 0.47

Q: 0.168 : 0.4 =
A: 0.42

Q: 1.24 : 0.4 =
A: 3.1

Q: 32 : 1 =
A: 32

Q: 0.152 : 0.08 =
A: 1.9

Q: 0.024 : 0.1 =
A: 0.24

Q: 0.054 : 0.2 =
A: 0.27

Q: 0.068 : 0.02 =
A: 3.4

Q: 4.8 : 0.2 =
A: 24

Q: 0.049 : 0.01 =
A: 4.9

Q: 0.48 : 0.4 =
A: 1.2

Q: 0.12 : 0.3 =
A: 0.4

Q: 0.06 : 0.04 =
A: 1.5

Q: 0.19 : 0.1 =
A: 1.9

Q: 4.2 : 0.1 =
A: 42

Q: 0.162 : 0.06 =
A: 2.7

Q: 0.104 : 0.8 =
A: 0.13

Q: 0.081 : 0.3 =
A: 0.27

Q: 0.56 : 0.4 =
A: 1.4

Q: 0.29 : 0.1 =
A: 2.9

Q: 0.087 : 0.3 =
A: 0.29

Q: 0.048 : 0.03 =
A: 1.6

Q: 16.8 : 0.8 =
A: 21

Q: 0.396 : 0.09 =
A: 4.4

Q: 14.5 : 0.5 =
A: 29

Q: 0.27 : 0.09 =
A: 3

Q: 0.172 : 0.4 =
A: 0.43

Q: 0.162 : 0.9 =
A: 0.18

Q: 0.2 : 0.04 =
A: 5

Q: 0.76 : 0.4 =
A: 1.9

Q: 13 : 1 =
A: 13

Q: 0.102 : 0.6 =
A: 0.17

Q: 0.099 : 0.9 =
A: 0.11

Q: 2.7 : 0.6 =
A: 4.5

Q: 15.4 : 0.7 =
A: 22

Q: 0.09 : 0.02 =
A: 4.5

Q: 0.098 : 0.2 =
A: 0.49

Q: 0.08 : 0.2 =
A: 0.4

Q: 0.048 : 0.04 =
A: 1.2

Q: 2.35 : 0.5 =
A: 4.7

Q: 17.5 : 0.7 =
A: 25

Q: 0.019 : 0.1 =
A: 0.19

Q: 0.076 : 0.4 =
A: 0.19

Q: 2.7 : 1 =
A: 2.7

Q: 5 : 0.5 =
A: 10

Q: 0.186 : 0.6 =
A: 0.31

Q: 0.33 : 1 =
A: 0.33

Q: 1.35 : 0.3 =
A: 4.5

Q: 10.4 : 0.4 =
A: 26

Q: 0.111 : 0.3 =
A: 0.37

Q: 0.4 : 1 =
A: 0.4

Q: 0.26 : 0.1 =
A: 2.6

Q: 1.9 : 0.1 =
A: 19

Q: 3.68 : 0.8 =
A: 4.6

Q: 44 : 1 =
A: 44

Q: 0.145 : 0.5 =
A: 0.29

Q: 0.96 : 0.6 =
A: 1.6

Q: 7.6 : 0.2 =
A: 38

Q: 0.138 : 0.6 =
A: 0.23

Q: 0.09 : 0.5 =
A: 0.18

Q: 0.108 : 0.09 =
A: 1.2

Q: 0.044 : 0.04 =
A: 1.1

Q: 0.065 : 0.5 =
A: 0.13

Q: 0.64 : 0.2 =
A: 3.2

Q: 0.052 : 0.4 =
A: 0.13

Q: 0.27 : 0.9 =
A: 0.3

Q: 0.136 : 0.04 =
A: 3.4

Q: 3.08 : 0.7 =
A: 4.4

Q: 23.5 : 0.5 =
A: 47

Q: 0.312 : 0.08 =
A: 3.9

Q: 0.044 : 0.4 =
A: 0.11

Q: 2.25 : 0.5 =
A: 4.5

Q: 15.2 : 0.4 =
A: 38

Q: 0.105 : 0.7 =
A: 0.15

Q: 3.8 : 1 =
A: 3.8

Q: 0.198 : 0.06 =
A: 3.3

Q: 0.144 : 0.3 =
A: 0.48

Q: 0.126 : 0.06 =
A: 2.1

Q: 0.78 : 0.6 =
A: 1.3

Q: 5.8 : 0.2 =
A: 29

Q: 0.094 : 0.2 =
A: 0.47

Q: 0.135 : 0.9 =
A: 0.15

Q: 1.9 : 0.5 =
A: 3.8

Q: 11.9 : 0.7 =
A: 17

Q: 0.21 : 0.07 =
A: 3

Q: 0.117 : 0.3 =
A: 0.39

Q: 3.96 : 0.9 =
A: 4.4

Q: 11 : 0.5 =
A: 22

Q: 0.256 : 0.8 =
A: 0.32

Q: 0.279 : 0.9 =
A: 0.31

Q: 4.9 : 0.1 =
A: 49

Q: 0.108 : 0.4 =
A: 0.27

Q: 0.34 : 1 =
A: 0.34

Q: 0.86 : 0.2 =
A: 4.3

Q: 0.432 : 0.09 =
A: 4.8

Q: 1.44 : 0.6 =
A: 2.4

Q: 21 : 1 =
A: 21

Q: 0.084 : 0.4 =
A: 0.21

Q: 2.88 : 0.8 =
A: 3.6

Q: 2 : 0.1 =
A: 20

Q: 0.074 : 0.2 =
A: 0.37

Q: 0.234 : 0.6 =
A: 0.39

Q: 0.308 : 0.07 =
A: 4.4

Q: 0.49 : 0.1 =
A: 4.9

Q: 8 : 0.8 =
A: 10

Q: 0.132 : 0.03 =
A: 4.4

Q: 0.017 : 0.1 =
A: 0.17

Q: 0.56 : 0.2 =
A: 2.8

Q: 7.6 : 0.4 =
A: 19

Q: 0.203 : 0.7 =
A: 0.29

Q: 0.26 : 1 =
A: 0.26

Q: 0.069 : 0.03 =
A: 2.3

Q: 2.64 : 0.6 =
A: 4.4

Q: 0.044 : 0.2 =
A: 0.22

Q: 0.315 : 0.7 =
A: 0.45

Q: 2.56 : 0.8 =
A: 3.2

Q: 0.294 : 0.06 =
A: 4.9

Q: 0.136 : 0.08 =
A: 1.7

Q: 1.32 : 0.6 =
A: 2.2

Q: 0.076 : 0.02 =
A: 3.8

Q: 0.011 : 0.1 =
A: 0.11

Q: 0.328 : 0.08 =
A: 4.1

Q: 0.25 : 0.1 =
A: 2.5

Q: 19 : 1 =
A: 19

Q: 0.05 : 0.01 =
A: 5

Q: 0.135 : 0.3 =
A: 0.45

Q: 0.37 : 1 =
A: 0.37

Q: 0.27 : 1 =
A: 0.27

Q: 0.144 : 0.09 =
A: 1.6

Q: 24.3 : 0.9 =
A: 27

Q: 0.4 : 0.08 =
A: 5

Q: 4.4 : 1 =
A: 4.4

Q: 18.5 : 0.5 =
A: 37

Q: 0.066 : 0.3 =
A: 0.22

Q: 0.24 : 0.1 =
A: 2.4

Q: 0.294 : 0.07 =
A: 4.2

Q: 0.9 : 0.5 =
A: 1.8

Q: 29.4 : 0.7 =
A: 42

Q: 0.088 : 0.04 =
A: 2.2

Q: 0.022 : 0.01 =
A: 2.2

Q: 0.276 : 0.06 =
A: 4.6

Q: 2.3 : 0.5 =
A: 4.6

Q: 17.6 : 0.4 =
A: 44

Q: 0.096 : 0.03 =
A: 3.2

Q: 2.1 : 0.5 =
A: 4.2

Q: 0.129 : 0.3 =
A: 0.43

Q: 0.333 : 0.09 =
A: 3.7

Q: 9.5 : 0.5 =
A: 19

Q: 0.072 : 0.03 =
A: 2.4

Q: 0.84 : 0.6 =
A: 1.4

Q: 1 : 0.1 =
A: 10

Q: 0.084 : 0.07 =
A: 1.2

Q: 0.288 : 0.6 =
A: 0.48

Q: 0.232 : 0.08 =
A: 2.9

Q: 4 : 0.8 =
A: 5

Q: 22.5 : 0.9 =
A: 25

Q: 0.031 : 0.01 =
A: 3.1

Q: 0.192 : 0.4 =
A: 0.48

Q: 1.17 : 0.3 =
A: 3.9

Q: 11.1 : 0.3 =
A: 37

Q: 0.258 : 0.6 =
A: 0.43

Q: 18.4 : 0.4 =
A: 46

Q: 0.102 : 0.06 =
A: 1.7

Q: 0.029 : 0.1 =
A: 0.29

Q: 2.4 : 0.5 =
A: 4.8

Q: 9.6 : 0.2 =
A: 48

Q: 0.32 : 0.08 =
A: 4

Q: 0.064 : 0.4 =
A: 0.16

Q: 0.98 : 0.7 =
A: 1.4

Q: 27.3 : 0.7 =
A: 39

Q: 0.152 : 0.8 =
A: 0.19

Q: 2.16 : 0.8 =
A: 2.7

Q: 36 : 0.8 =
A: 45

Q: 0.224 : 0.7 =
A: 0.32

Q: 0.044 : 0.1 =
A: 0.44

Q: 1.05 : 0.3 =
A: 3.5

Q: 0.261 : 0.9 =
A: 0.29

Q: 0.182 : 0.07 =
A: 2.6

Q: 0.11 : 0.1 =
A: 1.1

Q: 1.1 : 0.1 =
A: 11

Q: 0.033 : 0.03 =
A: 1.1

Q: 0.01 : 0.1 =
A: 0.1

Q: 1.84 : 0.8 =
A: 2.3

Q: 0.05 : 0.2 =
A: 0.25

Q: 3.78 : 0.9 =
A: 4.2

Q: 28.8 : 0.6 =
A: 48

Q: 0.155 : 0.05 =
A: 3.1

Q: 0.16 : 0.4 =
A: 0.4

Q: 0.078 : 0.02 =
A: 3.9

Q: 3 : 1 =
A: 3

Q: 12 : 0.8 =
A: 15

Q: 0.03 : 0.01 =
A: 3

Q: 0.04 : 0.2 =
A: 0.2

Q: 0.088 : 0.08 =
A: 1.1

Q: 3.4 : 1 =
A: 3.4

Q: 8.4 : 0.4 =
A: 21

Q: 0.016 : 0.01 =
A: 1.6

Q: 0.048 : 0.3 =
A: 0.16

Q: 9.9 : 0.9 =
A: 11

Q: 0.056 : 0.02 =
A: 2.8

Q: 0.329 : 0.07 =
A: 4.7

Q: 3.6 : 0.2 =
A: 18

Q: 0.246 : 0.6 =
A: 0.41

Q: 0.18 : 1 =
A: 0.18

Q: 21 : 0.6 =
A: 35

Q: 0.045 : 0.01 =
A: 4.5

Q: 2.94 : 0.7 =
A: 4.2

Q: 9 : 0.2 =
A: 45

Q: 0.282 : 0.6 =
A: 0.47

Q: 0.45 : 0.1 =
A: 4.5

Q: 0.062 : 0.2 =
A: 0.31

Q: 0.6 : 0.2 =
A: 3

Q: 28 : 0.8 =
A: 35

Q: 0.45 : 0.9 =
A: 0.5

Q: 0.038 : 0.02 =
A: 1.9

Q: 21 : 0.5 =
A: 42

Q: 0.116 : 0.4 =
A: 0.29

Q: 0.368 : 0.8 =
A: 0.46

Q: 0.62 : 0.2 =
A: 3.1

Q: 23.4 : 0.6 =
A: 39

Q: 0.012 : 0.01 =
A: 1.2

Q: 0.216 : 0.09 =
A: 2.4

Q: 1.84 : 0.4 =
A: 4.6

Q: 42.3 : 0.9 =
A: 47

Q: 0.04 : 0.02 =
A: 2

Q: 0.235 : 0.5 =
A: 0.47

Q: 0.057 : 0.03 =
A: 1.9

Q: 4 : 0.4 =
A: 10

Q: 0.01 : 0.01 =
A: 1

Q: 0.126 : 0.7 =
A: 0.18

Q: 3.4 : 0.1 =
A: 34

Q: 0.96 : 0.3 =
A: 3.2

Q: 0.086 : 0.2 =
A: 0.43

Q: 0.115 : 0.05 =
A: 2.3

Q: 12 : 0.4 =
A: 30

Q: 0.039 : 0.01 =
A: 3.9

Q: 0.13 : 1 =
A: 0.13

Q: 3.6 : 0.8 =
A: 4.5

Q: 10 : 0.2 =
A: 50

Q: 0.074 : 0.02 =
A: 3.7

Q: 0.24 : 1 =
A: 0.24

Q: 0.28 : 0.2 =
A: 1.4

Q: 0.126 : 0.09 =
A: 1.4

Q: 0.294 : 0.7 =
A: 0.42

Q: 0.066 : 0.03 =
A: 2.2

Q: 1.38 : 0.6 =
A: 2.3

Q: 4.4 : 0.2 =
A: 22

Q: 0.266 : 0.07 =
A: 3.8

Q: 0.215 : 0.5 =
A: 0.43

Q: 0.272 : 0.8 =
A: 0.34

Q: 0.6 : 0.3 =
A: 2

Q: 0.054 : 0.03 =
A: 1.8

Q: 24 : 0.5 =
A: 48

Q: 0.03 : 0.3 =
A: 0.1

Q: 0.084 : 0.04 =
A: 2.1

Q: 0.42 : 0.3 =
A: 1.4

Q: 13 : 0.5 =
A: 26

Q: 0.282 : 0.06 =
A: 4.7

Q: 43.2 : 0.9 =
A: 48

Q: 0.045 : 0.03 =
A: 1.5

Q: 0.051 : 0.3 =
A: 0.17

Q: 0.039 : 0.1 =
A: 0.39

Q: 0.225 : 0.05 =
A: 4.5

Q: 3.15 : 0.7 =
A: 4.5

Q: 3 : 0.2 =
A: 15

Q: 0.21 : 0.06 =
A: 3.5

Q: 0.045 : 0.1 =
A: 0.45

Q: 0.085 : 0.05 =
A: 1.7

Q: 2.15 : 0.5 =
A: 4.3

Q: 19.8 : 0.6 =
A: 33

Q: 3.43 : 0.7 =
A: 4.9

Q: 3.01 : 0.7 =
A: 4.3

Q: 29.6 : 0.8 =
A: 37

Q: 0.153 : 0.09 =
A: 1.7

Q: 0.45 : 0.3 =
A: 1.5

Q: 0.198 : 0.9 =
A: 0.22

Q: 7 : 0.7 =
A: 10

Q: 0.078 : 0.6 =
A: 0.13

Q: 19.5 : 0.5 =
A: 39

Q: 0.276 : 0.6 =
A: 0.46

Q: 0.06 : 0.03 =
A: 2

Q: 5.5 : 0.5 =
A: 11

Q: 0.138 : 0.3 =
A: 0.46

Q: 4.8 : 0.1 =
A: 48

Q: 0.306 : 0.9 =
A: 0.34

Q: 2.8 : 0.8 =
A: 3.5

Q: 2.08 : 0.8 =
A: 2.6

Q: 0.35 : 0.7 =
A: 0.5

Q: 0.252 : 0.6 =
A: 0.42

Q: 0.048 : 0.01 =
A: 4.8

Q: 0.66 : 0.3 =
A: 2.2

Q: 0.272 : 0.08 =
A: 3.4

Q: 0.168 : 0.06 =
A: 2.8

Q: 1.2 : 0.1 =
A: 12

Q: 0.192 : 0.6 =
A: 0.32

Q: 0.96 : 0.8 =
A: 1.2

Q: 9.8 : 0.7 =
A: 14

Q: 0.132 : 0.3 =
A: 0.44

Q: 0.135 : 0.09 =
A: 1.5

Q: 3.33 : 0.9 =
A: 3.7

Q: 3.1 : 0.1 =
A: 31

Q: 0.432 : 0.9 =
A: 0.48

Q: 1.86 : 0.6 =
A: 3.1

Q: 26.4 : 0.6 =
A: 44

Q: 0.296 : 0.8 =
A: 0.37

Q: 0.07 : 0.7 =
A: 0.1

Q: 0.093 : 0.3 =
A: 0.31

Q: 0.72 : 0.6 =
A: 1.2

Q: 0.066 : 0.06 =
A: 1.1

Q: 0.032 : 0.2 =
A: 0.16

Q: 0.15 : 0.6 =
A: 0.25

Q: 37.6 : 0.8 =
A: 47

Q: 0.16 : 0.04 =
A: 4

Q: 1 : 0.2 =
A: 5

Q: 1.6 : 0.1 =
A: 16

Q: 0.24 : 0.6 =
A: 0.4

Q: 0.192 : 0.08 =
A: 2.4

Q: 2.88 : 0.9 =
A: 3.2

Q: 15 : 0.3 =
A: 50

Q: 1.11 : 0.3 =
A: 3.7

Q: 5 : 0.1 =
A: 50

Q: 0.216 : 0.8 =
A: 0.27

Q: 0.062 : 0.02 =
A: 3.1

Q: 0.75 : 0.5 =
A: 1.5

Q: 15 : 1 =
A: 15

Q: 0.18 : 0.5 =
A: 0.36

Q: 1.02 : 0.6 =
A: 1.7

Q: 29 : 1 =
A: 29

Q: 0.2 : 0.8 =
A: 0.25

Q: 1.68 : 0.4 =
A: 4.2

Q: 21 : 0.7 =
A: 30

Q: 0.24 : 0.5 =
A: 0.48

Q: 0.243 : 0.09 =
A: 2.7

Q: 0.12 : 0.05 =
A: 2.4

Q: 0.075 : 0.3 =
A: 0.25

Q: 1.04 : 0.4 =
A: 2.6

Q: 0.175 : 0.5 =
A: 0.35

Q: 0.77 : 0.7 =
A: 1.1

Q: 1.8 : 0.1 =
A: 18

Q: 0.184 : 0.4 =
A: 0.46

Q: 0.48 : 0.2 =
A: 2.4

Q: 27.2 : 0.8 =
A: 34

Q: 0.08 : 0.5 =
A: 0.16

Q: 1.45 : 0.5 =
A: 2.9

Q: 32.4 : 0.9 =
A: 36

Q: 0.096 : 0.08 =
A: 1.2

Q: 0.12 : 0.06 =
A: 2

Q: 0.6 : 0.6 =
A: 1

Q: 6.2 : 0.2 =
A: 31

Q: 0.154 : 0.07 =
A: 2.2

Q: 0.102 : 0.3 =
A: 0.34

Q: 0.196 : 0.4 =
A: 0.49

Q: 0.224 : 0.07 =
A: 3.2

Q: 0.013 : 0.1 =
A: 0.13

Q: 2.59 : 0.7 =
A: 3.7

Q: 20 : 0.8 =
A: 25

Q: 0.308 : 0.7 =
A: 0.44

Q: 12 : 0.6 =
A: 20

Q: 35.1 : 0.9 =
A: 39