Title: vermenigvuldigen
Course: Rekenregels 8

Q: 2.33 x 0.9 =
A: 2.097

Q: 1.08 x 0.01 =
A: 0.0108

Q: 0.134 x 0.06 =
A: 0.00804

Q: 1.57 x 0.006 =
A: 0.00942

Q: 1.1 x 0.1 =
A: 0.11

Q: 0.104 x 0.4 =
A: 0.0416

Q: 1.99 x 0.2 =
A: 0.398

Q: 1.97 x 0.01 =
A: 0.0197

Q: 0.221 x 0.1 =
A: 0.0221

Q: 2.2 x 0.002 =
A: 0.0044

Q: 1.17 x 0.1 =
A: 0.117

Q: 0.147 x 0.3 =
A: 0.0441

Q: 1.67 x 0.8 =
A: 1.336

Q: 2.45 x 0.01 =
A: 0.0245

Q: 0.107 x 0.03 =
A: 0.00321

Q: 1.56 x 0.009 =
A: 0.01404

Q: 2.39 x 0.1 =
A: 0.239

Q: 0.153 x 0.4 =
A: 0.0612

Q: 2.16 x 0.1 =
A: 0.216

Q: 2.43 x 0.01 =
A: 0.0243

Q: 0.074 x 0.06 =
A: 0.00444

Q: 0.56 x 0.004 =
A: 0.00224

Q: 0.78 x 0.1 =
A: 0.078

Q: 0.087 x 1 =
A: 0.087

Q: 2.38 x 0.4 =
A: 0.952

Q: 2.4 x 0.01 =
A: 0.024

Q: 0.053 x 0.05 =
A: 0.00265

Q: 1.5 x 0.002 =
A: 0.003

Q: 2.02 x 0.1 =
A: 0.202

Q: 0.078 x 0.1 =
A: 0.0078

Q: 1.41 x 0.9 =
A: 1.269

Q: 1.59 x 0.01 =
A: 0.0159

Q: 0.126 x 0.07 =
A: 0.00882

Q: 0.84 x 0.002 =
A: 0.00168

Q: 0.61 x 0.1 =
A: 0.061

Q: 0.105 x 0.4 =
A: 0.042

Q: 2.35 x 0.5 =
A: 1.175

Q: 2.24 x 0.01 =
A: 0.0224

Q: 0.156 x 0.1 =
A: 0.0156

Q: 2.22 x 0.005 =
A: 0.0111

Q: 0.54 x 0.1 =
A: 0.054

Q: 0.136 x 0.7 =
A: 0.0952

Q: 1.32 x 0.3 =
A: 0.396

Q: 1.23 x 0.01 =
A: 0.0123

Q: 0.116 x 0.1 =
A: 0.0116

Q: 1.94 x 0.01 =
A: 0.0194

Q: 2.1 x 0.1 =
A: 0.21

Q: 0.176 x 0.8 =
A: 0.1408

Q: 1.44 x 0.2 =
A: 0.288

Q: 1.76 x 0.01 =
A: 0.0176

Q: 0.159 x 0.08 =
A: 0.01272

Q: 1.28 x 0.004 =
A: 0.00512

Q: 1.02 x 0.1 =
A: 0.102

Q: 0.087 x 0.2 =
A: 0.0174

Q: 1.03 x 0.6 =
A: 0.618

Q: 1.67 x 0.01 =
A: 0.0167

Q: 0.066 x 0.02 =
A: 0.00132

Q: 0.54 x 0.008 =
A: 0.00432

Q: 1.7 x 0.1 =
A: 0.17

Q: 0.065 x 0.3 =
A: 0.0195

Q: 1.48 x 0.4 =
A: 0.592

Q: 1.07 x 0.01 =
A: 0.0107

Q: 0.082 x 0.04 =
A: 0.00328

Q: 2.19 x 0.003 =
A: 0.00657

Q: 0.59 x 0.1 =
A: 0.059

Q: 0.085 x 0.3 =
A: 0.0255

Q: 2.22 x 0.2 =
A: 0.444

Q: 0.63 x 0.01 =
A: 0.0063

Q: 0.148 x 0.1 =
A: 0.0148

Q: 1.3 x 0.009 =
A: 0.0117

Q: 1.76 x 0.1 =
A: 0.176

Q: 0.208 x 1 =
A: 0.208

Q: 1.07 x 0.7 =
A: 0.749

Q: 0.158 x 0.01 =
A: 0.00158

Q: 0.5 x 0.005 =
A: 0.0025

Q: 0.97 x 0.1 =
A: 0.097

Q: 0.068 x 0.8 =
A: 0.0544

Q: 0.73 x 0.5 =
A: 0.365

Q: 1.21 x 0.01 =
A: 0.0121

Q: 0.196 x 0.05 =
A: 0.0098

Q: 2.01 x 0.006 =
A: 0.01206

Q: 2.34 x 0.1 =
A: 0.234

Q: 0.243 x 0.4 =
A: 0.0972

Q: 1.06 x 0.3 =
A: 0.318

Q: 1.93 x 0.01 =
A: 0.0193

Q: 0.127 x 0.06 =
A: 0.00762

Q: 1.04 x 0.01 =
A: 0.0104

Q: 1.13 x 0.1 =
A: 0.113

Q: 0.086 x 1 =
A: 0.086

Q: 1.82 x 0.6 =
A: 1.092

Q: 1.98 x 0.01 =
A: 0.0198

Q: 0.085 x 0.04 =
A: 0.0034

Q: 2.03 x 0.007 =
A: 0.01421

Q: 1.34 x 0.1 =
A: 0.134

Q: 0.08 x 0.8 =
A: 0.064

Q: 1.69 x 0.3 =
A: 0.507

Q: 0.83 x 0.01 =
A: 0.0083

Q: 0.205 x 0.09 =
A: 0.01845

Q: 1.24 x 0.009 =
A: 0.01116

Q: 0.5 x 0.1 =
A: 0.05

Q: 0.094 x 0.4 =
A: 0.0376

Q: 1.54 x 0.5 =
A: 0.77

Q: 0.91 x 0.01 =
A: 0.0091

Q: 0.116 x 0.06 =
A: 0.00696

Q: 1.36 x 0.001 =
A: 0.00136

Q: 1.16 x 0.1 =
A: 0.116

Q: 0.237 x 0.4 =
A: 0.0948

Q: 0.96 x 0.8 =
A: 0.768

Q: 0.81 x 0.01 =
A: 0.0081

Q: 0.072 x 0.09 =
A: 0.00648

Q: 2.08 x 0.009 =
A: 0.01872

Q: 2.27 x 0.1 =
A: 0.227

Q: 0.248 x 0.3 =
A: 0.0744

Q: 0.97 x 0.9 =
A: 0.873

Q: 2.04 x 0.01 =
A: 0.0204

Q: 0.124 x 0.01 =
A: 0.00124

Q: 2.14 x 0.006 =
A: 0.01284

Q: 0.53 x 0.1 =
A: 0.053

Q: 0.111 x 0.6 =
A: 0.0666

Q: 1.83 x 0.8 =
A: 1.464

Q: 2.26 x 0.01 =
A: 0.0226

Q: 0.24 x 0.09 =
A: 0.0216

Q: 1.52 x 0.003 =
A: 0.00456

Q: 0.7 x 0.1 =
A: 0.07

Q: 0.205 x 0.8 =
A: 0.164

Q: 1.41 x 0.6 =
A: 0.846

Q: 2.03 x 0.01 =
A: 0.0203

Q: 0.077 x 0.04 =
A: 0.00308

Q: 1.98 x 0.005 =
A: 0.0099

Q: 2.28 x 0.1 =
A: 0.228

Q: 0.116 x 0.3 =
A: 0.0348

Q: 0.51 x 1 =
A: 0.51

Q: 1.25 x 0.01 =
A: 0.0125

Q: 0.141 x 0.03 =
A: 0.00423

Q: 0.76 x 0.003 =
A: 0.00228

Q: 2.5 x 0.1 =
A: 0.25

Q: 0.238 x 0.8 =
A: 0.1904

Q: 1.74 x 0.9 =
A: 1.566

Q: 0.93 x 0.01 =
A: 0.0093

Q: 0.132 x 0.03 =
A: 0.00396

Q: 1.87 x 0.007 =
A: 0.01309

Q: 1.77 x 0.1 =
A: 0.177

Q: 0.083 x 0.7 =
A: 0.0581

Q: 1.83 x 0.7 =
A: 1.281

Q: 0.95 x 0.01 =
A: 0.0095

Q: 0.19 x 0.09 =
A: 0.0171

Q: 2.27 x 0.004 =
A: 0.00908

Q: 1.98 x 0.1 =
A: 0.198

Q: 0.228 x 0.1 =
A: 0.0228

Q: 0.67 x 0.4 =
A: 0.268

Q: 1.41 x 0.01 =
A: 0.0141

Q: 0.068 x 0.07 =
A: 0.00476

Q: 1.9 x 0.008 =
A: 0.0152

Q: 1.46 x 0.1 =
A: 0.146

Q: 0.118 x 0.8 =
A: 0.0944

Q: 1.17 x 0.6 =
A: 0.702

Q: 1.5 x 0.01 =
A: 0.015

Q: 0.187 x 0.1 =
A: 0.0187

Q: 0.91 x 0.006 =
A: 0.00546

Q: 0.76 x 0.1 =
A: 0.076

Q: 0.074 x 0.6 =
A: 0.0444

Q: 1.08 x 0.4 =
A: 0.432

Q: 2.01 x 0.01 =
A: 0.0201

Q: 0.082 x 0.02 =
A: 0.00164

Q: 0.67 x 0.001 =
A: 0.00067

Q: 1.62 x 0.1 =
A: 0.162

Q: 0.138 x 0.7 =
A: 0.0966

Q: 0.91 x 0.7 =
A: 0.637

Q: 1.45 x 0.01 =
A: 0.0145

Q: 0.108 x 0.07 =
A: 0.00756

Q: 1.61 x 0.01 =
A: 0.0161

Q: 2.38 x 0.1 =
A: 0.238

Q: 0.235 x 0.5 =
A: 0.1175

Q: 1.3 x 0.8 =
A: 1.04

Q: 0.85 x 0.01 =
A: 0.0085

Q: 0.156 x 0.03 =
A: 0.00468

Q: 0.82 x 0.002 =
A: 0.00164

Q: 1.94 x 0.1 =
A: 0.194

Q: 0.111 x 0.1 =
A: 0.0111

Q: 1.29 x 0.1 =
A: 0.129

Q: 1.96 x 0.01 =
A: 0.0196

Q: 0.194 x 0.03 =
A: 0.00582

Q: 1.65 x 0.01 =
A: 0.0165

Q: 0.73 x 0.1 =
A: 0.073

Q: 0.211 x 0.2 =
A: 0.0422

Q: 1.33 x 0.1 =
A: 0.133

Q: 0.075 x 0.04 =
A: 0.003

Q: 0.78 x 0.003 =
A: 0.00234

Q: 1.03 x 0.1 =
A: 0.103

Q: 0.062 x 0.8 =
A: 0.0496

Q: 1.57 x 0.5 =
A: 0.785

Q: 1.92 x 0.01 =
A: 0.0192

Q: 0.17 x 0.09 =
A: 0.0153

Q: 0.67 x 0.003 =
A: 0.00201

Q: 0.67 x 0.1 =
A: 0.067

Q: 0.067 x 0.3 =
A: 0.0201

Q: 0.6 x 1 =
A: 0.6

Q: 2.39 x 0.01 =
A: 0.0239

Q: 0.121 x 0.08 =
A: 0.00968

Q: 2.41 x 0.004 =
A: 0.00964

Q: 2.17 x 0.1 =
A: 0.217

Q: 0.11 x 0.2 =
A: 0.022

Q: 2.21 x 0.9 =
A: 1.989

Q: 0.59 x 0.01 =
A: 0.0059

Q: 0.116 x 0.05 =
A: 0.0058

Q: 1.53 x 0.01 =
A: 0.0153

Q: 2.47 x 0.1 =
A: 0.247

Q: 0.113 x 0.6 =
A: 0.0678

Q: 1.6 x 0.9 =
A: 1.44

Q: 1.63 x 0.01 =
A: 0.0163

Q: 0.188 x 0.03 =
A: 0.00564

Q: 2.5 x 0.003 =
A: 0.0075

Q: 0.075 x 0.2 =
A: 0.015

Q: 1.87 x 0.5 =
A: 0.935

Q: 1.58 x 0.01 =
A: 0.0158

Q: 0.091 x 0.1 =
A: 0.0091

Q: 1.79 x 0.009 =
A: 0.01611

Q: 1 x 0.1 =
A: 0.1

Q: 0.056 x 0.1 =
A: 0.0056

Q: 2.03 x 0.2 =
A: 0.406

Q: 0.06 x 0.09 =
A: 0.0054

Q: 1.12 x 0.009 =
A: 0.01008

Q: 0.93 x 0.1 =
A: 0.093

Q: 0.204 x 0.5 =
A: 0.102

Q: 0.211 x 0.06 =
A: 0.01266

Q: 0.83 x 0.007 =
A: 0.00581

Q: 1.43 x 0.1 =
A: 0.143

Q: 0.146 x 0.1 =
A: 0.0146

Q: 1.8 x 0.3 =
A: 0.54

Q: 2.28 x 0.01 =
A: 0.0228

Q: 0.132 x 0.08 =
A: 0.01056

Q: 1.59 x 0.006 =
A: 0.00954

Q: 1.68 x 0.1 =
A: 0.168

Q: 0.087 x 0.5 =
A: 0.0435

Q: 0.82 x 0.3 =
A: 0.246

Q: 1.46 x 0.01 =
A: 0.0146

Q: 0.18 x 0.01 =
A: 0.0018

Q: 2.17 x 0.01 =
A: 0.0217

Q: 0.77 x 0.1 =
A: 0.077

Q: 0.079 x 1 =
A: 0.079

Q: 0.97 x 0.4 =
A: 0.388

Q: 1.12 x 0.01 =
A: 0.0112

Q: 0.212 x 0.01 =
A: 0.00212

Q: 0.64 x 0.002 =
A: 0.00128

Q: 0.139 x 0.2 =
A: 0.0278

Q: 0.66 x 0.1 =
A: 0.066

Q: 0.8 x 0.01 =
A: 0.008

Q: 0.124 x 0.08 =
A: 0.00992

Q: 2.24 x 0.005 =
A: 0.0112

Q: 1.23 x 0.1 =
A: 0.123

Q: 0.105 x 0.5 =
A: 0.0525

Q: 1.38 x 0.6 =
A: 0.828

Q: 2.36 x 0.01 =
A: 0.0236

Q: 0.061 x 0.03 =
A: 0.00183

Q: 1.11 x 0.008 =
A: 0.00888

Q: 1.44 x 0.1 =
A: 0.144

Q: 0.133 x 0.8 =
A: 0.1064

Q: 2.02 x 0.01 =
A: 0.0202

Q: 0.085 x 0.02 =
A: 0.0017

Q: 0.69 x 0.004 =
A: 0.00276

Q: 1.22 x 0.1 =
A: 0.122

Q: 0.127 x 0.4 =
A: 0.0508

Q: 2.1 x 0.9 =
A: 1.89

Q: 1.54 x 0.01 =
A: 0.0154

Q: 0.082 x 0.03 =
A: 0.00246

Q: 2.35 x 0.006 =
A: 0.0141

Q: 1.27 x 0.1 =
A: 0.127

Q: 0.143 x 0.1 =
A: 0.0143

Q: 2.02 x 0.5 =
A: 1.01

Q: 2.23 x 0.01 =
A: 0.0223

Q: 0.215 x 0.08 =
A: 0.0172

Q: 0.54 x 0.002 =
A: 0.00108

Q: 0.79 x 0.1 =
A: 0.079

Q: 0.121 x 0.8 =
A: 0.0968

Q: 1.93 x 0.5 =
A: 0.965

Q: 0.76 x 0.01 =
A: 0.0076

Q: 0.215 x 0.03 =
A: 0.00645

Q: 0.71 x 0.005 =
A: 0.00355

Q: 2.23 x 0.1 =
A: 0.223

Q: 0.198 x 0.6 =
A: 0.1188

Q: 1.58 x 0.4 =
A: 0.632

Q: 1.82 x 0.01 =
A: 0.0182

Q: 0.154 x 0.06 =
A: 0.00924

Q: 0.58 x 0.004 =
A: 0.00232

Q: 0.067 x 0.2 =
A: 0.0134

Q: 1.14 x 0.01 =
A: 0.0114

Q: 0.206 x 0.06 =
A: 0.01236

Q: 0.57 x 0.001 =
A: 0.00057

Q: 0.94 x 0.1 =
A: 0.094

Q: 0.11 x 0.3 =
A: 0.033

Q: 1.8 x 0.6 =
A: 1.08

Q: 1.6 x 0.01 =
A: 0.016

Q: 0.185 x 0.07 =
A: 0.01295

Q: 1.52 x 0.001 =
A: 0.00152

Q: 2.07 x 0.1 =
A: 0.207

Q: 0.101 x 0.4 =
A: 0.0404

Q: 1.32 x 0.9 =
A: 1.188

Q: 1.9 x 0.01 =
A: 0.019

Q: 0.108 x 0.03 =
A: 0.00324

Q: 1.89 x 0.002 =
A: 0.00378

Q: 1.31 x 0.1 =
A: 0.131

Q: 0.237 x 0.7 =
A: 0.1659

Q: 1.56 x 0.5 =
A: 0.78

Q: 2.08 x 0.01 =
A: 0.0208

Q: 0.174 x 0.05 =
A: 0.0087

Q: 1.31 x 0.005 =
A: 0.00655

Q: 0.99 x 0.1 =
A: 0.099

Q: 0.177 x 0.2 =
A: 0.0354

Q: 2.28 x 0.8 =
A: 1.824

Q: 0.107 x 0.01 =
A: 0.00107

Q: 1.31 x 0.003 =
A: 0.00393

Q: 2.18 x 0.1 =
A: 0.218

Q: 0.072 x 0.4 =
A: 0.0288

Q: 1.49 x 0.6 =
A: 0.894

Q: 0.081 x 0.03 =
A: 0.00243

Q: 2.25 x 0.001 =
A: 0.00225

Q: 0.51 x 0.1 =
A: 0.051

Q: 0.237 x 0.5 =
A: 0.1185

Q: 0.76 x 0.5 =
A: 0.38

Q: 1.51 x 0.01 =
A: 0.0151

Q: 0.179 x 0.09 =
A: 0.01611

Q: 2.36 x 0.009 =
A: 0.02124

Q: 1.87 x 0.1 =
A: 0.187

Q: 0.079 x 0.5 =
A: 0.0395

Q: 0.87 x 0.2 =
A: 0.174

Q: 0.138 x 0.01 =
A: 0.00138

Q: 2.29 x 0.001 =
A: 0.00229

Q: 1.35 x 0.1 =
A: 0.135

Q: 0.157 x 0.3 =
A: 0.0471

Q: 0.135 x 0.04 =
A: 0.0054

Q: 1.09 x 0.002 =
A: 0.00218

Q: 1.14 x 0.1 =
A: 0.114

Q: 0.144 x 0.2 =
A: 0.0288

Q: 1.44 x 0.3 =
A: 0.432

Q: 0.201 x 0.1 =
A: 0.0201

Q: 2.33 x 0.01 =
A: 0.0233

Q: 0.196 x 0.9 =
A: 0.1764

Q: 1.66 x 0.7 =
A: 1.162

Q: 0.69 x 0.01 =
A: 0.0069

Q: 0.175 x 0.02 =
A: 0.0035

Q: 2.08 x 0.1 =
A: 0.208

Q: 0.197 x 0.5 =
A: 0.0985

Q: 2.11 x 0.5 =
A: 1.055

Q: 2.34 x 0.01 =
A: 0.0234

Q: 0.181 x 0.1 =
A: 0.0181

Q: 1.64 x 0.001 =
A: 0.00164

Q: 0.96 x 0.1 =
A: 0.096

Q: 0.222 x 0.7 =
A: 0.1554

Q: 1.01 x 0.3 =
A: 0.303

Q: 1.86 x 0.01 =
A: 0.0186

Q: 1.35 x 0.004 =
A: 0.0054

Q: 0.064 x 0.1 =
A: 0.0064

Q: 0.62 x 0.2 =
A: 0.124

Q: 0.65 x 0.01 =
A: 0.0065

Q: 2 x 0.005 =
A: 0.01

Q: 0.075 x 0.7 =
A: 0.0525

Q: 1.47 x 0.1 =
A: 0.147

Q: 2.5 x 0.01 =
A: 0.025

Q: 0.057 x 0.01 =
A: 0.00057

Q: 0.93 x 0.009 =
A: 0.00837

Q: 0.69 x 0.1 =
A: 0.069

Q: 0.156 x 0.3 =
A: 0.0468

Q: 1.36 x 1 =
A: 1.36

Q: 0.058 x 0.03 =
A: 0.00174

Q: 1.48 x 0.003 =
A: 0.00444

Q: 0.201 x 0.7 =
A: 0.1407

Q: 2.27 x 0.01 =
A: 0.0227

Q: 0.105 x 0.09 =
A: 0.00945

Q: 2.42 x 0.004 =
A: 0.00968

Q: 0.95 x 0.1 =
A: 0.095

Q: 0.163 x 0.6 =
A: 0.0978

Q: 1.58 x 0.6 =
A: 0.948

Q: 0.118 x 0.09 =
A: 0.01062

Q: 1.18 x 0.006 =
A: 0.00708

Q: 0.16 x 1 =
A: 0.16

Q: 1.86 x 0.6 =
A: 1.116

Q: 1.62 x 0.01 =
A: 0.0162

Q: 0.136 x 0.06 =
A: 0.00816

Q: 1.24 x 0.002 =
A: 0.00248

Q: 2.33 x 0.1 =
A: 0.233

Q: 0.131 x 0.8 =
A: 0.1048

Q: 0.86 x 0.4 =
A: 0.344

Q: 1.71 x 0.01 =
A: 0.0171

Q: 0.213 x 0.02 =
A: 0.00426

Q: 2.5 x 0.008 =
A: 0.02

Q: 0.64 x 0.3 =
A: 0.192

Q: 0.089 x 0.07 =
A: 0.00623

Q: 2.14 x 0.001 =
A: 0.00214

Q: 0.72 x 0.1 =
A: 0.072

Q: 0.249 x 0.9 =
A: 0.2241

Q: 2.09 x 0.4 =
A: 0.836

Q: 0.89 x 0.01 =
A: 0.0089

Q: 0.183 x 0.07 =
A: 0.01281

Q: 2.46 x 0.002 =
A: 0.00492

Q: 1.8 x 0.1 =
A: 0.18

Q: 0.082 x 0.5 =
A: 0.041

Q: 1.05 x 1 =
A: 1.05

Q: 0.142 x 0.08 =
A: 0.01136

Q: 1.2 x 0.001 =
A: 0.0012

Q: 1.88 x 0.1 =
A: 0.188

Q: 0.181 x 0.9 =
A: 0.1629

Q: 0.7 x 1 =
A: 0.7

Q: 0.84 x 0.01 =
A: 0.0084

Q: 0.214 x 0.03 =
A: 0.00642

Q: 1.64 x 0.002 =
A: 0.00328

Q: 0.98 x 0.1 =
A: 0.098

Q: 0.148 x 0.8 =
A: 0.1184

Q: 1.08 x 0.1 =
A: 0.108

Q: 0.164 x 0.09 =
A: 0.01476

Q: 1.37 x 0.005 =
A: 0.00685

Q: 0.058 x 0.3 =
A: 0.0174

Q: 2.32 x 1 =
A: 2.32

Q: 1.34 x 0.003 =
A: 0.00402

Q: 1.5 x 0.1 =
A: 0.15

Q: 0.182 x 1 =
A: 0.182

Q: 0.81 x 0.4 =
A: 0.324

Q: 1.15 x 0.01 =
A: 0.0115

Q: 0.052 x 0.06 =
A: 0.00312

Q: 1.56 x 0.1 =
A: 0.156

Q: 0.125 x 0.9 =
A: 0.1125

Q: 0.59 x 0.9 =
A: 0.531

Q: 1.03 x 0.01 =
A: 0.0103

Q: 0.231 x 0.05 =
A: 0.01155

Q: 1.63 x 0.008 =
A: 0.01304

Q: 2.4 x 0.1 =
A: 0.24

Q: 0.222 x 0.5 =
A: 0.111

Q: 2.29 x 0.3 =
A: 0.687

Q: 0.171 x 0.09 =
A: 0.01539

Q: 1.2 x 0.003 =
A: 0.0036

Q: 1.89 x 0.1 =
A: 0.189

Q: 0.191 x 0.6 =
A: 0.1146

Q: 0.67 x 0.8 =
A: 0.536

Q: 1.49 x 0.01 =
A: 0.0149

Q: 0.2 x 0.09 =
A: 0.018

Q: 1.74 x 0.008 =
A: 0.01392

Q: 0.91 x 0.1 =
A: 0.091

Q: 0.241 x 0.9 =
A: 0.2169

Q: 0.54 x 0.01 =
A: 0.0054

Q: 0.144 x 0.1 =
A: 0.0144

Q: 0.7 x 0.001 =
A: 0.0007

Q: 0.128 x 0.9 =
A: 0.1152

Q: 2.2 x 0.01 =
A: 0.022

Q: 0.062 x 0.05 =
A: 0.0031

Q: 1.47 x 0.009 =
A: 0.01323

Q: 1.83 x 0.1 =
A: 0.183

Q: 0.087 x 0.3 =
A: 0.0261

Q: 1.7 x 0.2 =
A: 0.34

Q: 1.01 x 0.01 =
A: 0.0101

Q: 0.228 x 0.04 =
A: 0.00912

Q: 0.73 x 0.005 =
A: 0.00365

Q: 0.115 x 0.4 =
A: 0.046

Q: 2.18 x 0.8 =
A: 1.744

Q: 2.31 x 0.01 =
A: 0.0231

Q: 0.069 x 0.09 =
A: 0.00621

Q: 1.3 x 0.004 =
A: 0.0052

Q: 0.203 x 0.8 =
A: 0.1624

Q: 0.99 x 0.8 =
A: 0.792

Q: 1.26 x 0.01 =
A: 0.0126

Q: 0.234 x 0.05 =
A: 0.0117

Q: 0.96 x 0.001 =
A: 0.00096

Q: 0.52 x 0.1 =
A: 0.052

Q: 0.149 x 0.6 =
A: 0.0894

Q: 1.89 x 0.5 =
A: 0.945

Q: 0.99 x 0.01 =
A: 0.0099

Q: 0.198 x 0.04 =
A: 0.00792

Q: 1.38 x 0.007 =
A: 0.00966

Q: 1.99 x 0.1 =
A: 0.199

Q: 0.234 x 0.3 =
A: 0.0702

Q: 2.22 x 0.4 =
A: 0.888

Q: 0.117 x 0.03 =
A: 0.00351

Q: 1.93 x 0.1 =
A: 0.193

Q: 0.163 x 0.9 =
A: 0.1467

Q: 1.95 x 0.7 =
A: 1.365

Q: 0.14 x 0.08 =
A: 0.0112

Q: 2.32 x 0.003 =
A: 0.00696

Q: 0.076 x 0.3 =
A: 0.0228

Q: 2.37 x 0.2 =
A: 0.474

Q: 1.16 x 0.01 =
A: 0.0116

Q: 0.083 x 0.06 =
A: 0.00498

Q: 0.62 x 0.004 =
A: 0.00248

Q: 2.22 x 0.1 =
A: 0.222

Q: 0.22 x 0.6 =
A: 0.132