Title: testing MDL-71156

Section 1
  Announcements
  assign
  book
  chat
  choice
  database
  external tool
  feedback
  file
  folder
  forum
  glossary
  lesson
  label
  page
  page
  quiz
  survey
  url
  wiki
  workshop
Section 2
Section 3
Section 4
Section 5