Title: Default for MDL-61514
Course: MDL-61514

Q: q1
- True
- False
A: False

Q: q2
- True
- False
A: False

Q: q3
- True
- False
A: False

Q: q4
- True
- False
A: False

Q: q5
- True
- False
A: False

Q: q6
- True
- False
A: False

Q: q7
- True
- False
A: False

Q: q8
- True
- False
A: False