Title: T/F 3

Q: If UV/vis spectroscopy is used to follow reactant concentration, a first order rate constant may be determined without knowing the optical extinction coefficient (epsilon).
- True
- False
A: True

Q: The experimental stoichiometric method can be used to determine the order with respect to different reactants.
- True
- False
A: False