Title: Q11 set

Q: The I.R. spectrum of compound g exhibited peaks at:

~2960 cm^-1
~2800 cm-1
~2720 cm-1
~1710 cm-1
- 3-pentanone
- pentanaldehyde
- 2-pentanone
- pentanoic acid
A: pentanaldehyde

Q: Where would 1-cyano propanol exhibit peaks in its I.R. spectrum?
- 3300 cm^-1, 2960 cm^-1, 1700 cm^-1
- 3300-3600 cm^-1, 3100 cm^-1, 2225 cm^-1
- 3300 cm^-1, 2700-3000 cm^-1, 2225^ cm^-1
- 3300-3600 cm^-1, 2960 cm^-1, 2225 cm^-1
A: 3300-3600 cm^-1, 2960 cm^-1, 2225 cm^-1