Title: Metric Units REVIEW
Course: quiz duplicate error

Q: Determine the most appropriate metric unit to go in the blank. Choose from km, m, cm, mm, L, mL, kg, g, and mg.

The circumference of the coin is 26 [Image].
- mL (incorrect)
- mm (correct)
- mg (incorrect)
- cm (incorrect)
- g (incorrect)
A: mm

Q: Decide whether the dose is reasonable or unreasonable. If it is unreasonable, indicate whether it is too much or too little.

Take 3.3 kg of calcium per day.
- Unreasonable, too little (incorrect)
- Unreasonable, too much (correct)
- Reasonable (incorrect)
A: Unreasonable, too much

Q: Convert the units.

80 L = [Image] mL
- 80,000 mL (correct)
- 0.08 mL (incorrect)
- 8000 mL (incorrect)
- 8 mL (incorrect)
A: 80,000 mL

Q: Decide whether the dose is reasonable or unreasonable. If it is unreasonable, indicate whether it is too much or too little.

Take an aspirin weighing 0.002 kilograms.
- Unreasonable, too much (incorrect)
- Unreasonable, too little (incorrect)
- Reasonable (correct)
A: Reasonable

Q: Convert the units.

13 kg = [Image] mg
- 0.013 mg (incorrect)
- 13,000,000 mg (correct)
- 13,000 mg (incorrect)
- 0.13 mg (incorrect)
A: 13,000,000 mg

Q: Convert the units.

54.7 g = [Image] kg
- 54,700 kg (incorrect)
- 5470 kg (incorrect)
- 0.0547 kg (correct)
- 0.00547 kg (incorrect)
A: 0.0547 kg

Q: Decide whether the dose is reasonable or unreasonable. If it is unreasonable, indicate whether it is too much or too little.

Put 4 liters of solution into the eye twice a day.
- Unreasonable, too little (incorrect)
- Unreasonable, too much (correct)
- Reasonable (incorrect)
A: Unreasonable, too much

Q: Give the meaning of the metric prefix.

milli
- 10,000 (incorrect)
- [Image] (correct)
- [Image] (incorrect)
- 1000 (incorrect)
A: [Image]

Q: Decide whether the dose is reasonable or unreasonable. If it is unreasonable, indicate whether it is too much or too little.

Take 3.4 L of cough syrup twice a day.
- Unreasonable, too little (incorrect)
- Unreasonable, too much (correct)
- Reasonable (incorrect)
A: Unreasonable, too much

Q: Determine the most appropriate metric unit to go in the blank. Choose from L, ml, kg, g, and mg.

The carton contained 420 [Image] of juice.
- mg (incorrect)
- g (incorrect)
- kg (incorrect)
- L (incorrect)
- mL (correct)
A: mL

Q: Determine the most appropriate metric unit to go in the blank. Choose from L, ml, kg, g, and mg.

The grain of sand weighs 2.6 [Image].
- kg (incorrect)
- mL (incorrect)
- mg (correct)
- g (incorrect)
- L (incorrect)
A: mg

Q: Choose the most reasonable metric length unit. Choose from km, m, cm, and mm.

Marian drove 336 [Image] on vacation.
- cm (incorrect)
- km (correct)
- mm (incorrect)
- m (incorrect)
A: km

Q: Give the meaning of the metric prefix.

centi
- 1000 (incorrect)
- [Image] (incorrect)
- 100 (incorrect)
- [Image] (correct)
A: [Image]

Q: Determine the most appropriate metric unit to go in the blank. Choose from km, m, cm, mm, L, mL, kg, g, and mg.

She took 220 [Image] of vitamin C.
- mg (correct)
- kg (incorrect)
- L (incorrect)
- mm (incorrect)
- g (incorrect)
A: mg

Q: Choose the most reasonable metric length unit. Choose from km, m, cm, and mm.

The book is 28 [Image] long.
- m (incorrect)
- cm (correct)
- mm (incorrect)
- km (incorrect)
A: cm

Q: Convert the units.

130 mL = [Image] L
- 13,000 L (incorrect)
- 0.13 L (correct)
- 1.3 L (incorrect)
- 130,000 L (incorrect)
A: 0.13 L

Q: Determine the most appropriate metric unit to go in the blank. Choose from L, ml, kg, g, and mg.

The tablet contained 450 [Image] of vitamin C.
- mg (correct)
- mL (incorrect)
- kg (incorrect)
- L (incorrect)
- g (incorrect)
A: mg

Q: Convert the units.

385 g = [Image] mg
- 0.0385 mg (incorrect)
- 38,500 mg (incorrect)
- 0.385 mg (incorrect)
- 385,000 mg (correct)
A: 385,000 mg

Q: Determine the most appropriate metric unit to go in the blank. Choose from km, m, cm, mm, L, mL, kg, g, and mg.

Each day I drive 14 [Image] to work.
- km (correct)
- cm (incorrect)
- kg (incorrect)
- m (incorrect)
- L (incorrect)
A: km

Q: Determine the most appropriate metric unit to go in the blank. Choose from L, ml, kg, g, and mg.

The apple weighs 130 [Image].
- kg (incorrect)
- g (correct)
- L (incorrect)
- mg (incorrect)
- mL (incorrect)
A: g

Q: Convert the units.

700 mL = [Image] L
- 70,000 L (incorrect)
- 7 L (incorrect)
- 0.7 L (correct)
- 700,000 L (incorrect)
A: 0.7 L

Q: Decide whether the dose is reasonable or unreasonable. If it is unreasonable, indicate whether it is too much or too little.

Take 125 milligrams of vitamin C every day.
- Unreasonable, too much (incorrect)
- Unreasonable, too little (incorrect)
- Reasonable (correct)
A: Reasonable

Q: Convert the units.

879 cm = __________ m
- 87,900 m (incorrect)
- 8.79 m (correct)
- 8790 m (incorrect)
- 87.90 m (incorrect)
A: 8.79 m

Q: Convert the units.

36 mL = [Image] L
- 0.036 L (correct)
- 3600 L (incorrect)
- 36,000 L (incorrect)
- 0.36 L (incorrect)
A: 0.036 L

Q: Convert the units.

10.3 kg = [Image] g
- 1030 g (incorrect)
- 0.00103 g (incorrect)
- 0.0103 g (incorrect)
- 10,300 g (correct)
A: 10,300 g

Q: Convert the units.

271 mm = __________ cm
- 27,100 cm (incorrect)
- 2.70 cm (incorrect)
- 2710 cm (incorrect)
- 27.1 cm (correct)
A: 27.1 cm

Q: Convert the units.

29.25 m = __________ km
- 2925 km (incorrect)
- 0.2925 km (incorrect)
- 29,250 km (incorrect)
- 0.02925 km (correct)
A: 0.02925 km

Q: Convert the units.

69.18 m = __________ mm
- 69,180 mm (correct)
- 0.0692 mm (incorrect)
- 0.692 mm (incorrect)
- 6918 mm (incorrect)
A: 69,180 mm

Q: Determine the most appropriate metric unit to go in the blank. Choose from L, ml, kg, g, and mg.

The capacity of the car's gas tank is 65 [Image]  .
- L (correct)
- kg (incorrect)
- mg (incorrect)
- g (incorrect)
- mL (incorrect)
A: L

Q: Convert the units.

1011 mL = [Image] L
- 1,011,000 L (incorrect)
- 10.11 L (incorrect)
- 101,100 L (incorrect)
- 1.011 L (correct)
A: 1.011 L

Q: Convert the units.

3 mm = __________ m
- 3,000 m (incorrect)
- 0.003 m (correct)
- 300 m (incorrect)
- 0.03 m (incorrect)
A: 0.003 m

Q: Determine the most appropriate metric unit to go in the blank. Choose from km, m, cm, mm, L, mL, kg, g, and mg.

Helen and Juan went hiking. Between the two of them they brought 6 [Image] of water.
- m (incorrect)
- mL (incorrect)
- L (correct)
- g (incorrect)
- mg (incorrect)
A: L

Q: Solve the problem.

A piece of lumber needs to be cut 559 cm long. How many meters is this?
- 55.9 m (incorrect)
- 55,900 m (incorrect)
- 5.59 m (correct)
- 5590 m (incorrect)
A: 5.59 m

Q: Determine the most appropriate metric unit to go in the blank. Choose from km, m, cm, mm, L, mL, kg, g, and mg.

The carton contained 330 [Image] of juice.
- L (incorrect)
- mm (incorrect)
- g (incorrect)
- mL (correct)
- mg (incorrect)
A: mL

Q: Convert the units.

74 km = __________ m
- 7400 m (incorrect)
- 0.074 m (incorrect)
- 0.74 m (incorrect)
- 74,000 m (correct)
A: 74,000 m

Q: Choose the most reasonable metric length unit. Choose from km, m, cm, and mm.

The length of the hammer is 37 [Image]  .
- mm (incorrect)
- km (incorrect)
- cm (correct)
- m (incorrect)
A: cm

Q: Decide whether the dose is reasonable or unreasonable. If it is unreasonable, indicate whether it is too much or too little.

Drink 1.3 liters of fluids every day.
- Unreasonable, too much (correct)
- Unreasonable, too little (incorrect)
- Reasonable (incorrect)
A: Unreasonable, too much

Q: Choose the most reasonable metric length unit. Choose from km, m, cm, and mm.

The distance from my town to the next town is 16 [Image].
- km (correct)
- mm (incorrect)
- m (incorrect)
- cm (incorrect)
A: km

Q: Determine the most appropriate metric unit to go in the blank. Choose from km, m, cm, mm, L, mL, kg, g, and mg.

The bird's wingspan is 25 [Image] .
- mg (incorrect)
- cm (correct)
- m (incorrect)
- mm (incorrect)
- mL (incorrect)
A: cm

Q: Convert the units.

22 m = __________ cm
- 2200 cm (correct)
- 0.22 cm (incorrect)
- 0.022 cm (incorrect)
- 22,000 cm (incorrect)
A: 2200 cm

Q: Determine the most appropriate metric unit to go in the blank. Choose from L, ml, kg, g, and mg.

Helen and Juan went hiking. Between the two of them they brought 5 [Image] of water.
- mg (incorrect)
- g (incorrect)
- kg (incorrect)
- mL (incorrect)
- L (correct)
A: L

Q: Choose the most reasonable metric length unit. Choose from km, m, cm, and mm.

The height of the paperback book is 21 [Image]  .
- cm (correct)
- mm (incorrect)
- km (incorrect)
- m (incorrect)
A: cm

Q: Convert the units.

1.1 L = [Image] mL
- 0.11 mL (incorrect)
- 0.0011 mL (incorrect)
- 110 mL (incorrect)
- 1100 mL (correct)
A: 1100 mL

Q: Convert the units.

0.91 g = [Image] mg
- 0.0091 mg (incorrect)
- 0.00091 mg (incorrect)
- 910 mg (correct)
- 91 mg (incorrect)
A: 910 mg

Q: Solve the problem.

A medical clinic has 0.5 L of a medication on hand. How many milliliters are on hand?
- 500 mL (correct)
- 5000 mL (incorrect)
- 5 mL (incorrect)
- 50 mL (incorrect)
A: 500 mL

Q: Convert the units.

0.86 L = [Image] mL
- 860 mL (correct)
- 86 mL (incorrect)
- 0.086 mL (incorrect)
- 0.00086 mL (incorrect)
A: 860 mL

Q: Convert the units.

161 mg = [Image] g
- 0.161 g (correct)
- 1.61 g (incorrect)
- 16,100 g (incorrect)
- 161,000 g (incorrect)
A: 0.161 g

Q: Choose the most reasonable metric length unit. Choose from km, m, cm, and mm.

The boy is 1.7 [Image] tall.
- cm (incorrect)
- m (correct)
- km (incorrect)
- mm (incorrect)
A: m

Q: Determine the most appropriate metric unit to go in the blank. Choose from L, ml, kg, g, and mg.

The weight of the coin is 11 [Image] .
- L (incorrect)
- mg (incorrect)
- mL (incorrect)
- g (correct)
- kg (incorrect)
A: g

Q: Convert the units.

6866 mL = [Image] L
- 6,866,000 L (incorrect)
- 686,600 L (incorrect)
- 68.66 L (incorrect)
- 6.866 L (correct)
A: 6.866 L

Q: Decide whether the dose is reasonable or unreasonable. If it is unreasonable, indicate whether it is too much or too little.

Dissolve the 250-gram tablet in 2.0 liters of water.
- Reasonable (correct)
- Unreasonable, too much (incorrect)
- Unreasonable, too little (incorrect)
A: Reasonable

Q: Decide whether the dose is reasonable or unreasonable. If it is unreasonable, indicate whether it is too much or too little.

Take 20 milliliters of cough syrup every four hours.
- Unreasonable, too little (incorrect)
- Unreasonable, too much (incorrect)
- Reasonable (correct)
A: Reasonable

Q: Determine the most appropriate metric unit to go in the blank. Choose from L, ml, kg, g, and mg.

The volume of coffee in the cup is 196 [Image]  .
- g (incorrect)
- kg (incorrect)
- L (incorrect)
- mg (incorrect)
- mL (correct)
A: mL

Q: Determine the most appropriate metric unit to go in the blank. Choose from L, ml, kg, g, and mg.

The baby weighs 3 [Image].
- L (incorrect)
- g (incorrect)
- mg (incorrect)
- mL (incorrect)
- kg (correct)
A: kg

Q: Convert the units.

362 L = [Image] mL
- 362,000 mL (correct)
- 36,200 mL (incorrect)
- 36.2 mL (incorrect)
- 0.362 mL (incorrect)
A: 362,000 mL

Q: Convert the units.

811 mg = [Image] kg
- 0.000811 kg (correct)
- 811,000 kg (incorrect)
- 81,100 kg (incorrect)
- 0.0811 kg (incorrect)
A: 0.000811 kg

Q: Solve the problem.

What is the difference in the lengths 7 km and 320 m? Give your answer in meters.
- 7320 m (incorrect)
- 7320 km (incorrect)
- 6680 m (correct)
- 69,680 m (incorrect)
A: 6680 m

Q: Determine the most appropriate metric unit to go in the blank. Choose from km, m, cm, mm, L, mL, kg, g, and mg.

The portion of fish weighs 117 [Image].
- g (correct)
- mm (incorrect)
- kg (incorrect)
- mL (incorrect)
- mg (incorrect)
A: g

Q: Convert the units.

74,000 g = [Image] kg
- 74 kg (correct)
- 0.74 kg (incorrect)
- 74,000,000 kg (incorrect)
- 740 kg (incorrect)
A: 74 kg

Q: Convert the units.

170 g = [Image] kg
- 17,000 kg (incorrect)
- 0.017 kg (incorrect)
- 170,000 kg (incorrect)
- 0.17 kg (correct)
A: 0.17 kg

Q: Solve the problem.

Steve drove 7 km and cycled 129 m. How many meters did he travel in total?
- 1297 m (incorrect)
- 129.007 m (incorrect)
- 7129 m (correct)
- 12,907 m (incorrect)
A: 7129 m

Q: Convert the units.

61 kg = [Image] g
- 6100 g (incorrect)
- 0.061 g (incorrect)
- 61,000 g (correct)
- 0.61 g (incorrect)
A: 61,000 g

Q: Choose the most reasonable metric length unit. Choose from km, m, cm, and mm.

The length of the nail is 34 [Image].
- m (incorrect)
- km (incorrect)
- cm (incorrect)
- mm (correct)
A: mm

Q: Solve the problem.

Julie rode her bicycle 26 km in one afternoon. How many m did she ride?
- 0.26 m (incorrect)
- 2600 m (incorrect)
- 26,000 m (correct)
- 0.026 m (incorrect)
A: 26,000 m

Q: Choose the most reasonable metric length unit. Choose from km, m, cm, and mm.

The length of the basketball court is 25 [Image] .
- km (incorrect)
- m (correct)
- mm (incorrect)
- cm (incorrect)
A: m

Q: Solve the problem.

The string on a balloon is 59 mm long. What is this length measured in cm? Round to the nearest tenth if necessary.
- 5.9 cm (correct)
- 590 cm (incorrect)
- 5900 cm (incorrect)
- 0.6 cm (incorrect)
A: 5.9 cm

Q: Solve the problem.

What is the sum of the lengths 44 cm and 3 m? Give your answer in centimeters.
- 47 cm (incorrect)
- 3044 cm (incorrect)
- 344 cm (correct)
- 74 cm (incorrect)
A: 344 cm

Q: Give the meaning of the metric prefix.

kilo
- 10,000 (incorrect)
- [Image] (incorrect)
- 1000 (correct)
- [Image] (incorrect)
A: 1000

Q: Convert the units.

46 L = [Image] mL
- 4600 mL (incorrect)
- 0.046 mL (incorrect)
- 46,000 mL (correct)
- 4.6 mL (incorrect)
A: 46,000 mL

Q: Solve the problem.

The string on a balloon is 86 mm long. What is this length measured in cm?
- 0.9 cm (incorrect)
- 8.6 cm (correct)
- 8600 cm (incorrect)
- 860 cm (incorrect)
A: 8.6 cm

Q: Solve the problem.

What is the sum of the lengths 7 km and 425 m? Give your answer in meters.
- 42,507 m (incorrect)
- 4257 m (incorrect)
- 7425 m (correct)
- 425.007 m (incorrect)
A: 7425 m

Q: Solve the problem.

Julie rode her bicycle 27 km in one afternoon. How many meters did she ride?
- 27,000 m (correct)
- 0.027 m (incorrect)
- 2700 m (incorrect)
- 0.27 m (incorrect)
A: 27,000 m

Q: Determine the most appropriate metric unit to go in the blank. Choose from km, m, cm, mm, L, mL, kg, g, and mg.

The cat weighs 4.1 [Image].
- g (incorrect)
- L (incorrect)
- mg (incorrect)
- kg (correct)
- m (incorrect)
A: kg

Q: Solve the problem.

How many km long is a 18,400 m race?
- 18.4 km (correct)
- 1,840,000 km (incorrect)
- 1.84 km (incorrect)
- 184 km (incorrect)
A: 18.4 km

Q: Choose the most reasonable metric length unit. Choose from km, m, cm, and mm.

The length of the cheerleader's baton is 1.9 [Image]  .
- m (correct)
- cm (incorrect)
- km (incorrect)
- mm (incorrect)
A: m

Q: Determine the most appropriate metric unit to go in the blank. Choose from km, m, cm, mm, L, mL, kg, g, and mg.

The plank is 1.3 [Image] long.
- m (correct)
- cm (incorrect)
- kg (incorrect)
- L (incorrect)
- g (incorrect)
A: m

Q: Determine the most appropriate metric unit to go in the blank. Choose from L, ml, kg, g, and mg.

The horse weighs 490 [Image] .
- L (incorrect)
- g (incorrect)
- kg (correct)
- mg (incorrect)
- mL (incorrect)
A: kg

Q: Convert the units.

6.21 m = __________ cm
- 621 cm (correct)
- 0.0621 cm (incorrect)
- 62.10 cm (incorrect)
- 0.621 cm (incorrect)
A: 621 cm