Title: Lesson 23
Course: quiz duplicate error

Q: B is the midpoint of [Image]D is the midpoint of [Image] and AE = 21. Find BD. The diagram is not to scale.
[Image]
- 42
- 21
- 11.5
- 10.5
A: 10.5

Q: What is the name of the segment inside the large triangle?
[Image]
- perpendicular bisector
- altitude
- median
- midsegment
A: midsegment

Q: Find the value of x. The diagram is not to scale.
[Image]
- 32
- 50
- 64
- 80
A: 64

Q: Find the length of the midsegment. The diagram is not to scale.
[Image]
- 24
- 0
- 42
- 84
A: 42

Q: Find the length of the midsegment. The diagram is not to scale.
[Image]
- 44
- 8.5
- 22
- 18
A: 22

Q: Find the length of the midsegment. The diagram is not to scale.
[Image]
- 28
- 20
- 0
- 40
A: 20

Q: Find the value of x.
[Image]
- 6
- [Image]
- 4
- 8
A: 4

Q: Points B, D, and F are midpoints of the sides of [Image]EC = 42 and DF = 22. Find AC. The diagram is not to scale.
[Image]
- 42
- 84
- 44
- 11
A: 44

Q: B is the midpoint of [Image]D is the midpoint of [Image] and AE = 17. Find BD. The diagram is not to scale.
[Image]
- 8.5
- 17
- 34
- 9.5
A: 8.5

Q: Use the information in the diagram to determine the height of the tree. The diagram is not to scale.
[Image]
- 100 ft
- 50 ft
- 25 ft
- 23 ft
A: 50 ft

Q: B is the midpoint of [Image]D is the midpoint of [Image] and AE = 9. Find BD. The diagram is not to scale.
[Image]
- 9
- 18
- 3.5
- 4.5
A: 4.5

Q: Find the value of x.
[Image]
- 5
- 6.5
- 6
- 4
A: 4

Q: A triangular side of the Transamerica Building in San Francisco, California, is 149 feet at its base. If the distance from a base corner of the building to its peak is 859 feet, how wide is the triangle halfway to the top?

  [Image]
- 298 ft
- 74.5 ft
- 149 ft
- 429.5 ft
A: 74.5 ft

Q: Points B, D, and F are midpoints of the sides of [Image]EC = 30 and DF = 23. Find AC. The diagram is not to scale.
[Image]
- 30
- 11.5
- 60
- 46
A: 46

Q: Use the information in the diagram to determine the height of the tree. The diagram is not to scale.
[Image]
- 75 ft
- 150 ft
- 35.5 ft
- 37.5 ft
A: 75 ft

Q: Find the value of x. The diagram is not to scale.
[Image]
- 60
- 56
- 30
- 62
A: 60

Q: Find the value of x.
[Image]
- 4
- 8
- [Image]
- 6
A: 4

Q: Find the value of x. The diagram is not to scale.
[Image]
- 86
- 46
- 28
- 56
A: 56

Q: Points B, D, and F are midpoints of the sides of [Image]EC = 39 and DF = 24. Find AC. The diagram is not to scale.
[Image]
- 48
- 39
- 78
- 12
A: 48