Title: Scale Map REVIEW
Course: quiz duplicate error

Q: Jhan is making a map of the store layout at Fairview Commons Mall. The scale of the map will be [Image] inch = 6 feet. If the actual distance from the jewelry store to the arcade is 42 feet, how long should this distance appear on the map?
- 504 inches (Set up and solve a proportion. [Image] The distance from the jewelry store to the arcade should be 3.5 inches on the map.)
- 7 inches (Set up and solve a proportion. [Image] The distance from the jewelry store to the arcade should be 3.5 inches on the map.)
- 2.5 inches (Set up and solve a proportion. [Image] The distance from the jewelry store to the arcade should be 3.5 inches on the map.)
- 3.5 inches (Set up and solve a proportion. [Image] The distance from the jewelry store to the arcade should be 3.5 inches on the map.)
A: 3.5 inches

Q: Carla is making a map of the store layout at Fairview Commons Mall. The scale of the map will be [Image] inch = 4 feet. If the actual distance from the jewelry store to the arcade is 72 feet, how long should this distance appear on the map?
- 11 inches (Set up and solve a proportion. [Image] The distance from the jewelry store to the arcade should be 9 inches on the map.)
- 9 inches (Set up and solve a proportion. [Image] The distance from the jewelry store to the arcade should be 9 inches on the map.)
- 576 inches (Set up and solve a proportion. [Image] The distance from the jewelry store to the arcade should be 9 inches on the map.)
- 18 inches (Set up and solve a proportion. [Image] The distance from the jewelry store to the arcade should be 9 inches on the map.)
A: 9 inches

Q: A model of a classic railroad train was built using the scale 1 inch : 10 feet. If the length of the model railroad is 28 inches, what is the actual length, in feet, of the railroad train?
A: 280*

Q: A model of a classic railroad train was built using the scale 1 inch : 9.5 feet. If the length of the model railroad is 28 inches, what is the actual length, in feet, of the railroad train?
A: 266*

Q: A model of a classic railroad train was built using the scale 1 inch : 9 feet. If the length of the model railroad is 20 inches, what is the actual length, in feet, of the railroad train?
A: 180*

Q: A model of a classic railroad train was built using the scale 1 inch : 9.5 feet. If the length of the model railroad is 24 inches, what is the actual length, in feet, of the railroad train?
A: 228*