Title: Metric Units
Course: quiz duplicate error

Q: Choose the most reasonable metric length unit. Choose from km, m, cm, and mm.

The length of the hammer is 32 [Image]  .
- mm (incorrect)
- km (incorrect)
- cm (correct)
- m (incorrect)
A: cm

Q: Choose the most reasonable metric length unit. Choose from km, m, cm, and mm.

The length of the basketball court is 27 [Image] .
- km (incorrect)
- m (correct)
- mm (incorrect)
- cm (incorrect)
A: m

Q: Determine the most appropriate metric unit to go in the blank. Choose from L, ml, kg, g, and mg.

The capacity of the car's gas tank is 70 [Image]  .
- L (correct)
- kg (incorrect)
- mg (incorrect)
- g (incorrect)
- mL (incorrect)
A: L

Q: Determine the most appropriate metric unit to go in the blank. Choose from L, ml, kg, g, and mg.

The baby weighs 3.2 [Image].
- L (incorrect)
- g (incorrect)
- mg (incorrect)
- mL (incorrect)
- kg (correct)
A: kg

Q: Solve the problem.

A piece of lumber needs to be cut 202 cm long. How many meters is this?
- 20.2 m (incorrect)
- 20,200 m (incorrect)
- 2.02 m (correct)
- 2020 m (incorrect)
A: 2.02 m

Q: Choose the most reasonable metric length unit. Choose from km, m, cm, and mm.

The distance from my town to the next town is 19 [Image].
- km (correct)
- mm (incorrect)
- m (incorrect)
- cm (incorrect)
A: km

Q: Convert the units.

8 km = __________ m
- 800 m (incorrect)
- 0.008 m (incorrect)
- 0.08 m (incorrect)
- 8,000 m (correct)
A: 8,000 m

Q: Convert the units.

2.06 m = __________ cm
- 206 cm (correct)
- 0.0206 cm (incorrect)
- 20.60 cm (incorrect)
- 0.206 cm (incorrect)
A: 206 cm

Q: Convert the units.

89 mm = __________ m
- 89,000 m (incorrect)
- 0.089 m (correct)
- 8900 m (incorrect)
- 0.89 m (incorrect)
A: 0.089 m

Q: Solve the problem.

The string on a balloon is 57 mm long. What is this length measured in cm?
- 0.6 cm (incorrect)
- 5.7 cm (correct)
- 5700 cm (incorrect)
- 570 cm (incorrect)
A: 5.7 cm

Q: Convert the units.

81.44 m = __________ km
- 8144 km (incorrect)
- 0.8144 km (incorrect)
- 81,440 km (incorrect)
- 0.08144 km (correct)
A: 0.08144 km

Q: Choose the most reasonable metric length unit. Choose from km, m, cm, and mm.

The length of the cheerleader's baton is 1.0 [Image]  .
- m (correct)
- cm (incorrect)
- km (incorrect)
- mm (incorrect)
A: m

Q: Solve the problem.

What is the difference in the lengths 3 km and 410 m? Give your answer in meters.
- 3410 m (incorrect)
- 3410 km (incorrect)
- 2590 m (correct)
- 29,590 m (incorrect)
A: 2590 m

Q: Solve the problem.

Julie rode her bicycle 18 km in one afternoon. How many m did she ride?
- 0.18 m (incorrect)
- 1800 m (incorrect)
- 18,000 m (correct)
- 0.018 m (incorrect)
A: 18,000 m

Q: Give the meaning of the metric prefix.

centi
- 1000 (incorrect)
- [Image] (incorrect)
- 100 (incorrect)
- [Image] (correct)
A: [Image]

Q: Convert the units.

970 mm = __________ cm
- 97,000 cm (incorrect)
- 9.70 cm (incorrect)
- 9700 cm (incorrect)
- 97 cm (correct)
A: 97 cm

Q: Determine the most appropriate metric unit to go in the blank. Choose from L, ml, kg, g, and mg.

The tablet contained 370 [Image] of vitamin C.
- mg (correct)
- mL (incorrect)
- kg (incorrect)
- L (incorrect)
- g (incorrect)
A: mg

Q: Give the meaning of the metric prefix.

milli
- 10,000 (incorrect)
- [Image] (correct)
- [Image] (incorrect)
- 1000 (incorrect)
A: [Image]

Q: Choose the most reasonable metric length unit. Choose from km, m, cm, and mm.

The boy is 1.2 [Image] tall.
- cm (incorrect)
- m (correct)
- km (incorrect)
- mm (incorrect)
A: m

Q: Choose the most reasonable metric length unit. Choose from km, m, cm, and mm.

The height of the paperback book is 22 [Image]  .
- cm (correct)
- mm (incorrect)
- km (incorrect)
- m (incorrect)
A: cm

Q: Choose the most reasonable metric length unit. Choose from km, m, cm, and mm.

The length of the nail is 25 [Image].
- m (incorrect)
- km (incorrect)
- cm (incorrect)
- mm (correct)
A: mm

Q: Determine the most appropriate metric unit to go in the blank. Choose from L, ml, kg, g, and mg.

Helen and Juan went hiking. Between the two of them they brought 9 [Image] of water.
- mg (incorrect)
- g (incorrect)
- kg (incorrect)
- mL (incorrect)
- L (correct)
A: L

Q: Convert the units.

9.45 m = __________ dm
- 945 dm (incorrect)
- 94.5 dm (correct)
- 0.095 dm (incorrect)
- 0.945 dm (incorrect)
A: 94.5 dm

Q: Choose the most reasonable metric length unit. Choose from km, m, cm, and mm.

The book is 29 [Image] long.
- m (incorrect)
- cm (correct)
- mm (incorrect)
- km (incorrect)
A: cm

Q: Determine the most appropriate metric unit to go in the blank. Choose from L, ml, kg, g, and mg.

The carton contained 430 [Image] of juice.
- mg (incorrect)
- g (incorrect)
- kg (incorrect)
- L (incorrect)
- mL (correct)
A: mL

Q: Convert the units.

80 m = __________ cm
- 8000 cm (correct)
- 0.8 cm (incorrect)
- 0.08 cm (incorrect)
- 80,000 cm (incorrect)
A: 8000 cm

Q: Solve the problem.

What is the sum of the lengths 3 km and 889 m? Give your answer in meters.
- 88,903 m (incorrect)
- 8893 m (incorrect)
- 3889 m (correct)
- 889.003 m (incorrect)
A: 3889 m

Q: Convert the units.

933 cm = __________ m
- 93,300 m (incorrect)
- 9.33 m (correct)
- 9330 m (incorrect)
- 93.30 m (incorrect)
A: 9.33 m

Q: Solve the problem.

How many km long is a 3000 m race?
- 3 km (correct)
- 300,000 km (incorrect)
- 0.3 km (incorrect)
- 30 km (incorrect)
A: 3 km

Q: Convert the units.

86.40 m = __________ mm
- 86,400 mm (correct)
- 0.0864 mm (incorrect)
- 0.864 mm (incorrect)
- 8640 mm (incorrect)
A: 86,400 mm

Q: Give the meaning of the metric prefix.

kilo
- 10,000 (incorrect)
- [Image] (incorrect)
- 1000 (correct)
- [Image] (incorrect)
A: 1000

Q: Determine the most appropriate metric unit to go in the blank. Choose from L, ml, kg, g, and mg.

The apple weighs 111 [Image].
- kg (incorrect)
- g (correct)
- L (incorrect)
- mg (incorrect)
- mL (incorrect)
A: g

Q: Determine the most appropriate metric unit to go in the blank. Choose from L, ml, kg, g, and mg.

The grain of sand weighs 3.8 [Image].
- kg (incorrect)
- mL (incorrect)
- mg (correct)
- g (incorrect)
- L (incorrect)
A: mg

Q: Choose the most reasonable metric length unit. Choose from km, m, cm, and mm.

Marian drove 337 [Image] on vacation.
- cm (incorrect)
- km (correct)
- mm (incorrect)
- m (incorrect)
A: km

Q: Solve the problem.

What is the sum of the lengths 19 cm and 3 m? Give your answer in centimeters.
- 22 cm (incorrect)
- 3019 cm (incorrect)
- 319 cm (correct)
- 49 cm (incorrect)
A: 319 cm

Q: Decide whether the dose is reasonable or unreasonable. If it is unreasonable, indicate whether it is too much or too little.

Take 2.9 L of cough syrup twice a day.
- Unreasonable, too little (incorrect)
- Unreasonable, too much (correct)
- Reasonable (incorrect)
A: Unreasonable, too much

Q: Convert the units.

891 mg = [Image] kg
- 0.000891 kg (correct)
- 891,000 kg (incorrect)
- 89,100 kg (incorrect)
- 0.0891 kg (incorrect)
A: 0.000891 kg

Q: Solve the problem.

Julie rode her bicycle 48 km in one afternoon. How many meters did she ride?
- 48,000 m (correct)
- 0.048 m (incorrect)
- 4800 m (incorrect)
- 0.48 m (incorrect)
A: 48,000 m

Q: Convert the units.

3.5 L = [Image] mL
- 0.35 mL (incorrect)
- 0.0035 mL (incorrect)
- 350 mL (incorrect)
- 3500 mL (correct)
A: 3500 mL

Q: Determine the most appropriate metric unit to go in the blank. Choose from km, m, cm, mm, L, mL, kg, g, and mg.

She took 530 [Image] of vitamin C.
- mg (correct)
- kg (incorrect)
- L (incorrect)
- mm (incorrect)
- g (incorrect)
A: mg

Q: Convert the units.

13.8 kg = [Image] g
- 1380 g (incorrect)
- 0.00138 g (incorrect)
- 0.0138 g (incorrect)
- 13,800 g (correct)
A: 13,800 g

Q: Determine the most appropriate metric unit to go in the blank. Choose from km, m, cm, mm, L, mL, kg, g, and mg.

The bird's wingspan is 29 [Image] .
- mg (incorrect)
- cm (correct)
- m (incorrect)
- mm (incorrect)
- mL (incorrect)
A: cm

Q: Convert the units.

271 L = [Image] mL
- 271,000 mL (correct)
- 27,100 mL (incorrect)
- 27.1 mL (incorrect)
- 0.271 mL (incorrect)
A: 271,000 mL

Q: Convert the units.

1292 mL = [Image] L
- 1,292,000 L (incorrect)
- 12.92 L (incorrect)
- 129,200 L (incorrect)
- 1.292 L (correct)
A: 1.292 L

Q: Determine the most appropriate metric unit to go in the blank. Choose from L, ml, kg, g, and mg.

The weight of the coin is 12 [Image] .
- L (incorrect)
- mg (incorrect)
- mL (incorrect)
- g (correct)
- kg (incorrect)
A: g

Q: Convert the units.

296 g = [Image] kg
- 29,600 kg (incorrect)
- 0.0296 kg (incorrect)
- 296,000 kg (incorrect)
- 0.296 kg (correct)
A: 0.296 kg

Q: Convert the units.

628 g = [Image] mg
- 0.0628 mg (incorrect)
- 62,800 mg (incorrect)
- 0.628 mg (incorrect)
- 628,000 mg (correct)
A: 628,000 mg

Q: Determine the most appropriate metric unit to go in the blank. Choose from km, m, cm, mm, L, mL, kg, g, and mg.

The portion of fish weighs 149 [Image].
- g (correct)
- mm (incorrect)
- kg (incorrect)
- mL (incorrect)
- mg (incorrect)
A: g

Q: Decide whether the dose is reasonable or unreasonable. If it is unreasonable, indicate whether it is too much or too little.

Take 4.1 kg of calcium per day.
- Unreasonable, too little (incorrect)
- Unreasonable, too much (correct)
- Reasonable (incorrect)
A: Unreasonable, too much

Q: Convert the units.

42.7 g = [Image] kg
- 42,700 kg (incorrect)
- 4270 kg (incorrect)
- 0.0427 kg (correct)
- 0.00427 kg (incorrect)
A: 0.0427 kg

Q: Convert the units.

31 kg = [Image] g
- 3100 g (incorrect)
- 0.031 g (incorrect)
- 31,000 g (correct)
- 0.31 g (incorrect)
A: 31,000 g

Q: Determine the most appropriate metric unit to go in the blank. Choose from km, m, cm, mm, L, mL, kg, g, and mg.

The plank is 1 [Image] long.
- m (correct)
- cm (incorrect)
- kg (incorrect)
- L (incorrect)
- g (incorrect)
A: m

Q: Convert the units.

89,000 g = [Image] kg
- 89 kg (correct)
- 0.89 kg (incorrect)
- 89,000,000 kg (incorrect)
- 890 kg (incorrect)
A: 89 kg

Q: Convert the units.

449 mL = [Image] L
- 44,900 L (incorrect)
- 0.449 L (correct)
- 4.49 L (incorrect)
- 449,000 L (incorrect)
A: 0.449 L

Q: Determine the most appropriate metric unit to go in the blank. Choose from km, m, cm, mm, L, mL, kg, g, and mg.

Each day I drive 9 [Image] to work.
- km (correct)
- cm (incorrect)
- kg (incorrect)
- m (incorrect)
- L (incorrect)
A: km

Q: Determine the most appropriate metric unit to go in the blank. Choose from L, ml, kg, g, and mg.

The horse weighs 470 [Image] .
- L (incorrect)
- g (incorrect)
- kg (correct)
- mg (incorrect)
- mL (incorrect)
A: kg

Q: Decide whether the dose is reasonable or unreasonable. If it is unreasonable, indicate whether it is too much or too little.

Take 375 milligrams of vitamin C every day.
- Unreasonable, too much (incorrect)
- Unreasonable, too little (incorrect)
- Reasonable (correct)
A: Reasonable

Q: Decide whether the dose is reasonable or unreasonable. If it is unreasonable, indicate whether it is too much or too little.

Put 3 liters of solution into the eye twice a day.
- Unreasonable, too little (incorrect)
- Unreasonable, too much (correct)
- Reasonable (incorrect)
A: Unreasonable, too much

Q: Determine the most appropriate metric unit to go in the blank. Choose from km, m, cm, mm, L, mL, kg, g, and mg.

The circumference of the coin is 35 [Image].
- mL (incorrect)
- mm (correct)
- mg (incorrect)
- cm (incorrect)
- g (incorrect)
A: mm

Q: Convert the units.

160 mg = [Image] g
- 0.16 g (correct)
- 1.6 g (incorrect)
- 16,000 g (incorrect)
- 160,000 g (incorrect)
A: 0.16 g

Q: Convert the units.

604 mL = [Image] L
- 60,400 L (incorrect)
- 6.04 L (incorrect)
- 0.604 L (correct)
- 604,000 L (incorrect)
A: 0.604 L

Q: Decide whether the dose is reasonable or unreasonable. If it is unreasonable, indicate whether it is too much or too little.

Take an aspirin weighing 0.003 milligrams.
- Unreasonable, too much (incorrect)
- Reasonable (incorrect)
- Unreasonable, too little (correct)
A: Unreasonable, too little

Q: Determine the most appropriate metric unit to go in the blank. Choose from L, ml, kg, g, and mg.

The volume of coffee in the cup is 193 [Image]  .
- g (incorrect)
- kg (incorrect)
- L (incorrect)
- mg (incorrect)
- mL (correct)
A: mL

Q: Convert the units.

56 L = [Image] mL
- 56,000 mL (correct)
- 0.056 mL (incorrect)
- 5600 mL (incorrect)
- 5.6 mL (incorrect)
A: 56,000 mL

Q: Convert the units.

48 mL = [Image] L
- 0.048 L (correct)
- 4800 L (incorrect)
- 48,000 L (incorrect)
- 0.48 L (incorrect)
A: 0.048 L

Q: Solve the problem.

The string on a balloon is 79 mm long. What is this length measured in cm? Round to the nearest tenth if necessary.
- 7.9 cm (correct)
- 790 cm (incorrect)
- 7900 cm (incorrect)
- 0.8 cm (incorrect)
A: 7.9 cm

Q: Convert the units.

20 kg = [Image] mg
- 0.02 mg (incorrect)
- 20,000,000 mg (correct)
- 20,000 mg (incorrect)
- 0.2 mg (incorrect)
A: 20,000,000 mg

Q: Decide whether the dose is reasonable or unreasonable. If it is unreasonable, indicate whether it is too much or too little.

Drink 1.5 milliliters of fluids every day.
- Reasonable (correct)
- Unreasonable, too little (incorrect)
- Unreasonable, too much (incorrect)
A: Reasonable

Q: Determine the most appropriate metric unit to go in the blank. Choose from km, m, cm, mm, L, mL, kg, g, and mg.

The cat weighs 2.5 [Image].
- g (incorrect)
- L (incorrect)
- mg (incorrect)
- kg (correct)
- m (incorrect)
A: kg

Q: Determine the most appropriate metric unit to go in the blank. Choose from km, m, cm, mm, L, mL, kg, g, and mg.

The carton contained 440 [Image] of juice.
- L (incorrect)
- mm (incorrect)
- g (incorrect)
- mL (correct)
- mg (incorrect)
A: mL

Q: Decide whether the dose is reasonable or unreasonable. If it is unreasonable, indicate whether it is too much or too little.

Take 18 liters of cough syrup every four hours.
- Unreasonable, too little (incorrect)
- Reasonable (incorrect)
- Unreasonable, too much (correct)
A: Unreasonable, too much

Q: Decide whether the dose is reasonable or unreasonable. If it is unreasonable, indicate whether it is too much or too little.

Dissolve the 250-gram tablet in 2.1 liters of water.
- Reasonable (correct)
- Unreasonable, too much (incorrect)
- Unreasonable, too little (incorrect)
A: Reasonable

Q: Solve the problem.

A medical clinic has 0.7 L of a medication on hand. How many milliliters are on hand?
- 700 mL (correct)
- 7000 mL (incorrect)
- 7 mL (incorrect)
- 70 mL (incorrect)
A: 700 mL

Q: Convert the units.

0.84 g = [Image] mg
- 0.0084 mg (incorrect)
- 0.00084 mg (incorrect)
- 840 mg (correct)
- 84 mg (incorrect)
A: 840 mg

Q: Determine the most appropriate metric unit to go in the blank. Choose from km, m, cm, mm, L, mL, kg, g, and mg.

Helen and Juan went hiking. Between the two of them they brought 5 [Image] of water.
- m (incorrect)
- mL (incorrect)
- L (correct)
- g (incorrect)
- mg (incorrect)
A: L

Q: Solve the problem.

Steve drove 9 km and cycled 689 m. How many meters did he travel in total?
- 6899 m (incorrect)
- 689.009 m (incorrect)
- 9689 m (correct)
- 68,909 m (incorrect)
A: 9689 m

Q: Convert the units.

0.63 L = [Image] mL
- 630 mL (correct)
- 63 mL (incorrect)
- 0.063 mL (incorrect)
- 0.00063 mL (incorrect)
A: 630 mL

Q: Convert the units.

24 L = [Image] mL
- 2400 mL (incorrect)
- 0.024 mL (incorrect)
- 24,000 mL (correct)
- 2.4 mL (incorrect)
A: 24,000 mL

Q: Convert the units.

5758 mL = [Image] L
- 5,758,000 L (incorrect)
- 575,800 L (incorrect)
- 57.58 L (incorrect)
- 5.758 L (correct)
A: 5.758 L