Title: Chocolate Quiz
Course: Grades Instructor - DO NOT MODIFY

You have been asked to design a chocolate buffet for a wedding. The only specifications are that all chocolate items must be edible (nothing is for strictly decorative purposes), and you are limited to one 20-foot table.

What items will you include in your buffet?

Q: Match the terms from the class glossary with their correct descriptions.
- It was invented in France as a small, rich chocolate made of ganache, often flavored and usually shaped into a ball. The original recipe, rolled in cocoa, was named after a black fungus because of its physical resemblance. | Truffle
- It is indicative of high cocoa content and well-tempered chocolate. | Snap
- A velvety smooth blend of chocolate and cream, often with butter added, that is usually dipped in chocolate and rolled in cocoa powder and sugar or other coatings to make a truffle. It is often used as a center for bonbons. | Ganache

Q: [Image: brownies]

Which of the following ingredients would be standard items for chocolte brownies?

Hint: Two do not belong. Your score will be reduced -50% for each wrong choice.
- eggs
- flour
- pumkin seeds (Sorry, but most people use nuts for a crunching texture.)
- cocoa
- butter or margerine
- sugar
- baking powder
- salt
- vanilla extract
- asparagus (You're not serious, are you?)
A: eggs; flour; cocoa; butter or margerine; sugar; baking powder; salt; vanilla extract
If right: Good for you and your brownies.
If partly right: Your brownies might taste a little funny missing ingredients, AND adding pumkin seeds or asparagus.
If wrong: How could you put pumkin seeds or asparagus in chocolate brownies?

Q: [Image: M&M personalities]

Which M & M candy is typically represented as female in television commercials?
- Orange
- Yellow
- Red
- Green
- Blue
A: Green

Q: [Image: MM bag]

How many M&M candies are in a small, individual snack bag?

(These are the type given out at Halloween.)

Answer will allow a variance of +/- 5.
A: 17 (± 5)
Feedback ("17"): The correct answer is 17, but you will get full credit if you came within 5 (i.e., anywhere between 12 and 22).

Q: The home offices for the Hershey's, Mars Incorporated, and Nestles chocolate companies are all located in the United States.
- True (Whoops! Nestlé is actually based in Switzerland.)
- False (Very good! Nestlé is actually based in Switzerland.)
A: False