Title: Molar Mass Calculations
Course: Chemistry Revision

Q: Calculate the molar mass of the following compound, to 1 decimal place:

NaBr
A: 102.9 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

PbSO_4
A: 303.3 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

Ca(OH)_2
A: 74.1 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

Na_3PO_4
A: 164 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

(NH_4)_2CO_3
A: 96 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

CO_2
A: 44 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

H_2O
A: 18 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

NH_3
A: 17 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

NaCl
A: 58.4 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

C_6H_12O_6
A: 180.2 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

Cl_2
A: 70.9 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

KOH
A: 56.1 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

BeCl_2
A: 80 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

Mg(OH)_2
A: 58.3 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

H_3PO_4
A: 98 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

CH_3COOH
A: 60 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

H_2SO_4
A: 98.1 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

NaHCO_3
A: 84 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

HNO_3
A: 63 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

HCl
A: 36.5 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

H_2
A: 2 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

O_2
A: 32 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

MgCl_2
A: 95.2 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

MgF_2
A: 62.3 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

SiO_2
A: 60.1 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

CaCO_3
A: 100.1 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

HF
A: 20 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

CH_4
A: 16 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

Fe_2O_3
A: 160 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

Na_2O
A: 62 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

CuSO_4
A: 159.6 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

NH_4OH
A: 35 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

CaSO_4
A: 136.1 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

ZnSO_4
A: 161.4 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

H_3BO_3
A: 61.8 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

CH_2O_3
A: 62 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

C_3H_6O
A: 58.1 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

LiOH
A: 23.9 (± 1)

Q: Calculate the molar mass of the following compound, to 1 decimal place:

F_2
A: 38 (± 1)